Summary Page Created:Tue June 6, 2006 22:47 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 890030

Instrument: ACIS Obs ID: 5290 Source: A1795 PI: Dr. CXC Calibration Title: Mapping the Depth of the Contaminant on the ACIS Filters with Abell 11795

acisf05290N002 full img2.fits acisf05290N002 cntr img2.fits

Summary Page Created:Tue June 6, 2006 22:47 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 890030

Instrument: ACIS Obs ID: 5290 Source: A1795 PI: Dr. CXC Calibration Title: Mapping the Depth of the Contaminant on the ACIS Filters with Abell 11795

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-06-07T02:04:28 Date and time of file creation DATE-OBS 2004-01-23T20:54:36 Observation start date DATE-END 2004-01-24T01:34:02 Observation end date RA PNT 207.25334354292 Pointing RA DEC PNT 26.702089447062 Pointing Dec ROLL PNT 75.924710819976 Pointing Roll RA TARG 207.219583 Observer’s specified target RA DEC TARG 26.590833 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-06-07T02:46:47 Date and time of file creation DATE-OBS 2004-01-23T20:54:36 Observation start date DATE-END 2004-01-24T01:34:02 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-01237 Detector GRATING NONE Grating OBJECT A1795 Source name TITLE Mapping the Depth of the Contaminant on the ACIS Filters with Abell 11795

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 5290 Observation id SEQ NUM 890030 Sequence number RA NOM 207.25334354292 Nominal RA DEC NOM 26.702089447062 Nominal Dec ROLL NOM 75.924710819976 Nominal Roll

Summary Page Created:Tue June 6, 2006 22:47 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 890030

Instrument: ACIS Obs ID: 5290 Source: A1795 PI: Dr. CXC Calibration Title: Mapping the Depth of the Contaminant on the ACIS Filters with Abell 11795

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 207.258416 26.784545 129.958328 12.710674 10.224346 207.274305 26.631289 77.142860 10.727882 7.190875 207.413022 26.704389 75.034088 11.236771 6.677549 207.286802 26.811248 57.794998 9.269734 6.234806 207.331333 26.726931 56.428570 9.375030 6.019028 207.413804 26.631232 61.872501 10.810755 5.723236 207.219015 26.593098 243.747498 48.825127 4.992255 207.012337 26.672484 87.887047 17.825068 4.930531 207.409882 26.644330 37.272728 9.499959 3.923462 207.446421 26.606472 43.708332 11.959747 3.654620