Summary Page Created:Fri March 17, 2006 13:32 EST page: 1 of 3

Chandra X-ray Center Seq Num: 890034

Instrument: ACIS Obs ID: 6162 Source: A1795 PI: Dr. CXC Calibration Title: Monitoring the Spatial Variation of the ACIS Contaminant with Abell 1795

acisf06162N002 full img2.fits acisf06162N002 cntr img2.fits

Summary Page Created:Fri March 17, 2006 13:32 EST page: 2 of 3

Chandra X-ray Center Seq Num: 890034

Instrument: ACIS Obs ID: 6162 Source: A1795 PI: Dr. CXC Calibration Title: Monitoring the Spatial Variation of the ACIS Contaminant with Abell 1795

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 ASCDS version number DATE 2006-03-17T17:44:55 Date and time of file creation DATE-OBS 2005-03-28T08:29:47 Observation start date DATE-END 2005-03-28T12:44:07 Observation end date RA PNT 207.19982875217 Pointing RA DEC PNT 26.606038997492 Pointing Dec ROLL PNT 143.86313101612 Pointing Roll RA TARG 207.219583 Observer’s specified target RA DEC TARG 26.590833 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 154.09092712 Focal Plane Temperature [K] FSW VERS 31 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 ASCDS version number DATE 2006-03-17T18:31:11 Date and time of file creation DATE-OBS 2005-03-28T08:29:47 Observation start date DATE-END 2005-03-28T12:44:07 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-01236 Detector GRATING NONE Grating OBJECT A1795 Source name TITLE Monitoring the Spatial Variation of the ACIS Contaminant with Abell 1795

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 6162 Observation id SEQ NUM 890034 Sequence number RA NOM 207.19982875217 Nominal RA DEC NOM 26.606038997492 Nominal Dec ROLL NOM 143.86313101612 Nominal Roll

Summary Page Created:Fri March 17, 2006 13:32 EST page: 3 of 3

Chandra X-ray Center Seq Num: 890034

Instrument: ACIS Obs ID: 6162 Source: A1795 PI: Dr. CXC Calibration Title: Monitoring the Spatial Variation of the ACIS Contaminant with Abell 1795

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 207.145604 26.519444 1460.568237 40.986752 35.635132 207.274084 26.630928 93.857140 11.723293 8.006039 207.261929 26.474426 44.795456 9.276819 4.828752 207.410725 26.644030 42.125000 10.800447 3.900301 207.269951 26.499470 31.795454 8.437037 3.768557 207.100343 26.558923 24.238636 6.825787 3.551039 207.179046 26.708349 25.385000 7.805873 3.252038 207.168635 26.623709 20.714285 6.496838 3.188364 206.867697 26.464473 51.084442 16.155666 3.162014 207.146907 26.533621 17.958334 5.957597 3.014359