Summary Page Created:Fri March 17, 2006 16:57 EST page: 1 of 3

Chandra X-ray Center Seq Num: 890035

Instrument: ACIS Obs ID: 6163 Source: A1795 PI: Dr. CXC Calibration Title: Monitoring the Spatial Variation of the ACIS Contaminant with Abell 1795

acisf06163N002 full img2.fits acisf06163N002 cntr img2.fits

Summary Page Created:Fri March 17, 2006 16:57 EST page: 2 of 3

Chandra X-ray Center Seq Num: 890035

Instrument: ACIS Obs ID: 6163 Source: A1795 PI: Dr. CXC Calibration Title: Monitoring the Spatial Variation of the ACIS Contaminant with Abell 1795

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 ASCDS version number DATE 2006-03-17T21:02:15 Date and time of file creation DATE-OBS 2005-03-31T02:56:00 Observation start date DATE-END 2005-03-31T07:38:14 Observation end date RA PNT 207.19843979629 Pointing RA DEC PNT 26.604562447411 Pointing Dec ROLL PNT 148.56546151176 Pointing Roll RA TARG 207.219583 Observer’s specified target RA DEC TARG 26.590833 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 154.25218201 Focal Plane Temperature [K] FSW VERS 31 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 ASCDS version number DATE 2006-03-17T21:56:27 Date and time of file creation DATE-OBS 2005-03-31T02:56:00 Observation start date DATE-END 2005-03-31T07:38:14 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-01236 Detector GRATING NONE Grating OBJECT A1795 Source name TITLE Monitoring the Spatial Variation of the ACIS Contaminant with Abell 1795

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 6163 Observation id SEQ NUM 890035 Sequence number RA NOM 207.19843979629 Nominal RA DEC NOM 26.604562447411 Nominal Dec ROLL NOM 148.56546151176 Nominal Roll

Summary Page Created:Fri March 17, 2006 16:57 EST page: 3 of 3

Chandra X-ray Center Seq Num: 890035

Instrument: ACIS Obs ID: 6163 Source: A1795 PI: Dr. CXC Calibration Title: Monitoring the Spatial Variation of the ACIS Contaminant with Abell 1795

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 207.273645 26.631276 100.428574 12.770299 7.864230 207.256962 26.784744 79.458336 14.032979 5.662257 207.411708 26.705200 84.255814 15.406832 5.468730 207.330443 26.727206 47.151726 10.967457 4.299240 207.242024 26.828734 54.423538 14.038440 3.876751 207.381511 26.749249 48.401993 12.663052 3.822301 206.983823 26.535809 41.830357 11.410211 3.666046 207.229616 26.584890 30.285715 8.579084 3.530180 207.099693 26.559422 26.556818 7.648496 3.472162 207.105037 26.540564 26.282499 8.058732 3.261369