Summary Page Created:Tue November 20, 2007 08:05 EST page: 1 of 3

Chandra X-ray Center Seq Num: 200032

Instrument: HRC Obs ID: 607 Source: WR 147 PI: Dr Julian Pittard Title: DIRECT HRC-I IMAGING OF THE COLLIDING WINDS SHOCK IN WR 147

hrcf00607N005 full img2.fits hrcf00607N005 cntr img2.fits

Summary Page Created:Tue November 20, 2007 08:05 EST page: 2 of 3

Chandra X-ray Center Seq Num: 200032

Instrument: HRC Obs ID: 607 Source: WR 147 PI: Dr Julian Pittard Title: DIRECT HRC-I IMAGING OF THE COLLIDING WINDS SHOCK IN WR 147

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-20T12:51:08 Date and time of file creation DATE-OBS 2000-07-10T12:11:15 Observation start date DATE-END 2000-07-10T14:09:18 Observation end date RA PNT 309.17739580374 Pointing RA DEC PNT 40.35535502453 Pointing Dec ROLL PNT 160.31978780572 Pointing Roll RA TARG 309.18125 Observer’s specified target RA DEC TARG 40.352222 Observer’s specified target Dec DEGAP hrciD1999-07- 22gaplookupN0003.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-20T13:04:35 Date and time of file creation DATE-OBS 2000-07-10T12:11:15 Observation start date DATE-END 2000-07-10T14:09:18 Observation end date INSTRUME HRC Instrument DETNAM HRC-I Detector GRATING NONE Grating OBJECT WR 147 Source name TITLE DIRECT HRC-I IMAGING OF THE COLLIDING WINDS SHOCK IN WR 147

Propos

OBSERVER Dr Julian Pittard Principal investigator OBS ID 607 Observation id SEQ NUM 200032 Sequence number RA NOM 309.17739580374 Nominal RA DEC NOM 40.35535502453 Nominal Dec ROLL NOM 160.31978780572 Nominal Roll

Summary Page Created:Tue November 20, 2007 08:05 EST page: 3 of 3

Chandra X-ray Center Seq Num: 200032

Instrument: HRC Obs ID: 607 Source: WR 147 PI: Dr Julian Pittard Title: DIRECT HRC-I IMAGING OF THE COLLIDING WINDS SHOCK IN WR 147

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 309.181715 40.352146 118.541664 13.262454 8.938140 309.544035 40.209208 69.122925 17.943220 3.852314 309.428618 40.181566 53.406895 14.496511 3.684121 308.781205 40.481058 69.906975 19.829596 3.525386 309.576268 40.226330 75.191490 21.469734 3.502209 309.003807 40.067869 62.511627 18.284840 3.418768 308.789690 40.406533 56.684822 17.012959 3.331861 309.125278 40.356386 19.000000 5.949306 3.193650 309.280987 40.662465 63.142857 20.251404 3.117949 309.065923 40.037990 60.485371 19.707457 3.069162