Summary Page Created:Wed May 30, 2007 13:56 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 200040

Instrument: ACIS Obs ID: 615 Source: VB 8 PI: DR. THOMAS FLEMING Title: X-RAY EMISSION AT THE BOTTOM OF THE MAIN SEQUENCE

acisf00615N003 full img2.fits acisf00615N003 cntr img2.fits

Summary Page Created:Wed May 30, 2007 13:56 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 200040

Instrument: ACIS Obs ID: 615 Source: VB 8 PI: DR. THOMAS FLEMING Title: X-RAY EMISSION AT THE BOTTOM OF THE MAIN SEQUENCE

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.10 ASCDS version number DATE 2007-05-30T17:22:53 Date and time of file creation DATE-OBS 2000-07-10T14:09:18 Observation start date DATE-END 2000-07-10T17:11:48 Observation end date RA PNT 253.8916029627 Pointing RA DEC PNT -8.402461294282 Pointing Dec ROLL PNT 244.47037416982 Pointing Roll RA TARG 253.8975 Observer’s specified target RA DEC TARG -8.394417 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.10 ASCDS version number DATE 2007-05-30T17:55:20 Date and time of file creation DATE-OBS 2000-07-10T14:09:18 Observation start date DATE-END 2000-07-10T17:11:48 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-456789 Detector GRATING NONE Grating OBJECT VB 8 Source name TITLE X-RAY EMISSION AT THE BOT- TOM OF THE MAIN SEQUENCE

Proposal title

OBSERVER DR. THOMAS FLEMING Principal investigator OBS ID 615 Observation id SEQ NUM 200040 Sequence number RA NOM 253.8916029627 Nominal RA DEC NOM -8.402461294282 Nominal Dec ROLL NOM 244.47037416982 Nominal Roll

Summary Page Created:Wed May 30, 2007 13:56 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 200040

Instrument: ACIS Obs ID: 615 Source: VB 8 PI: DR. THOMAS FLEMING Title: X-RAY EMISSION AT THE BOTTOM OF THE MAIN SEQUENCE

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 253.869517 -8.336315 3462.285645 88.227127 39.242870 253.896696 -8.394778 115.857140 12.709394 9.115867 253.934433 -8.450921 110.285713 12.765002 8.639694 253.912407 -8.414112 64.142860 10.029329 6.395528 253.817156 -8.703612 180.083054 31.144728 5.782136 253.706354 -8.651157 156.428574 33.447235 4.676876 253.828748 -8.478299 33.794998 7.646168 4.419861 253.819093 -8.490916 37.055172 8.702211 4.258132 253.709902 -8.637402 129.296432 30.445902 4.246759 253.955289 -8.256855 36.974998 9.271842 3.987881