Summary Page Created:Thu May 31, 2007 16:54 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 500118

Instrument: ACIS Obs ID: 1827 Source: SGR 1806-20 PI: Gautam Vasisht Title: THE SOFT GAMMA-RAY REPEATER SGR 1806-20

acisf01827N003 full img2.fits acisf01827N003 cntr img2.fits

Summary Page Created:Thu May 31, 2007 16:54 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 500118

Instrument: ACIS Obs ID: 1827 Source: SGR 1806-20 PI: Gautam Vasisht Title: THE SOFT GAMMA-RAY REPEATER SGR 1806-20

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.10 ASCDS version number DATE 2007-05-31T20:03:08 Date and time of file creation DATE-OBS 2000-07-24T18:22:46 Observation start date DATE-END 2000-07-24T20:16:41 Observation end date RA PNT 272.16525345881 Pointing RA DEC PNT -20.421048153611 Pointing Dec ROLL PNT 265.86076912632 Pointing Roll RA TARG 272.168 Observer’s specified target RA DEC TARG -20.411417 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.10 ASCDS version number DATE 2007-05-31T20:53:19 Date and time of file creation DATE-OBS 2000-07-24T18:22:46 Observation start date DATE-END 2000-07-24T20:16:41 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-235678 Detector GRATING NONE Grating OBJECT SGR 1806-20 Source name TITLE THE SOFT GAMMA-RAY RE- PEATER SGR 1806-20

Proposal title

OBSERVER Gautam Vasisht Principal investigator OBS ID 1827 Observation id SEQ NUM 500118 Sequence number RA NOM 272.16525345881 Nominal RA DEC NOM -20.421048153611 Nominal Dec ROLL NOM 265.86076912632 Nominal Roll

Summary Page Created:Thu May 31, 2007 16:54 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 500118

Instrument: ACIS Obs ID: 1827 Source: SGR 1806-20 PI: Gautam Vasisht Title: THE SOFT GAMMA-RAY REPEATER SGR 1806-20

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 272.163868 -20.411037 798.714294 31.055880 25.718616 272.206785 -20.728943 186.926910 24.715832 7.563044 272.081636 -20.722095 151.780731 24.689720 6.147527 272.223238 -20.604262 50.166668 11.098504 4.520129 272.193304 -20.728513 120.196014 26.809271 4.483375 272.078913 -20.683166 95.291664 22.392540 4.255509 272.158715 -20.727282 108.578072 26.356607 4.119577 271.931290 -20.449217 37.807846 9.973824 3.790707 272.081018 -20.676762 77.477272 21.370291 3.625467 272.209379 -20.721116 82.895538 23.590750 3.513900