Summary Page Created:Tue November 20, 2007 20:57 EST page: 1 of 3

Chandra X-ray Center Seq Num: 600036

Instrument: HRC Obs ID: 276 Source: M31 - CENTER PI: Dr. Stephen Murray Title: MONITORING M31

hrcf00276N004 full img2.fits hrcf00276N004 cntr img2.fits

Summary Page Created:Tue November 20, 2007 20:57 EST page: 2 of 3

Chandra X-ray Center Seq Num: 600036

Instrument: HRC Obs ID: 276 Source: M31 - CENTER PI: Dr. Stephen Murray Title: MONITORING M31

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-21T01:48:20 Date and time of file creation DATE-OBS 2000-09-11T20:42:14 Observation start date DATE-END 2000-09-11T21:07:24 Observation end date RA PNT 10.680459509752 Pointing RA DEC PNT 41.272223186079 Pointing Dec ROLL PNT 152.42013230631 Pointing Roll RA TARG 10.685 Observer’s specified target RA DEC TARG 41.268972 Observer’s specified target Dec DEGAP hrciD1999-07- 22gaplookupN0003.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-21T01:55:51 Date and time of file creation DATE-OBS 2000-09-11T20:42:14 Observation start date DATE-END 2000-09-11T21:07:24 Observation end date INSTRUME HRC Instrument DETNAM HRC-I Detector GRATING NONE Grating OBJECT M31 - CENTER Source name TITLE MONITORING M31 Proposal title OBSERVER Dr. Stephen Murray Principal investigator OBS ID 276 Observation id SEQ NUM 600036 Sequence number RA NOM 10.680459509752 Nominal RA DEC NOM 41.272223186079 Nominal Dec ROLL NOM 152.42013230631 Nominal Roll

Summary Page Created:Tue November 20, 2007 20:57 EST page: 3 of 3

Chandra X-ray Center Seq Num: 600036

Instrument: HRC Obs ID: 276 Source: M31 - CENTER PI: Dr. Stephen Murray Title: MONITORING M31

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 10.660782 41.267691 206.375000 16.744761 12.324751 10.716524 41.518500 94.916664 13.683685 6.936484 10.794312 41.247560 52.238636 8.887569 5.877719 10.728810 41.267578 45.000000 8.126118 5.537700 10.696504 41.274560 43.916668 8.312194 5.283402 10.702137 41.255910 43.238636 8.290386 5.215516 10.617935 41.206559 41.875000 8.344716 5.018146 10.762224 41.256323 34.897499 7.512185 4.645452 10.809533 41.122624 36.318180 7.942403 4.572694 10.718817 41.261098 31.000000 6.853433 4.523280