Summary Page Created:Tue November 20, 2007 21:42 EST page: 1 of 3

Chandra X-ray Center Seq Num: 600037

Instrument: HRC Obs ID: 277 Source: M31 - CENTER PI: Dr. Stephen Murray Title: MONITORING M31

hrcf00277N005 full img2.fits hrcf00277N005 cntr img2.fits

Summary Page Created:Tue November 20, 2007 21:42 EST page: 2 of 3

Chandra X-ray Center Seq Num: 600037

Instrument: HRC Obs ID: 277 Source: M31 - CENTER PI: Dr. Stephen Murray Title: MONITORING M31

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-21T02:33:13 Date and time of file creation DATE-OBS 2000-10-12T04:15:19 Observation start date DATE-END 2000-10-12T04:40:29 Observation end date RA PNT 10.679523551124 Pointing RA DEC PNT 41.269242420792 Pointing Dec ROLL PNT 192.15631903894 Pointing Roll RA TARG 10.685 Observer’s specified target RA DEC TARG 41.268972 Observer’s specified target Dec DEGAP hrciD1999-07- 22gaplookupN0003.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-21T02:41:04 Date and time of file creation DATE-OBS 2000-10-12T04:15:19 Observation start date DATE-END 2000-10-12T04:40:29 Observation end date INSTRUME HRC Instrument DETNAM HRC-I Detector GRATING NONE Grating OBJECT M31 - CENTER Source name TITLE MONITORING M31 Proposal title OBSERVER Dr. Stephen Murray Principal investigator OBS ID 277 Observation id SEQ NUM 600037 Sequence number RA NOM 10.679523551124 Nominal RA DEC NOM 41.269242420792 Nominal Dec ROLL NOM 192.15631903894 Nominal Roll

Summary Page Created:Tue November 20, 2007 21:42 EST page: 3 of 3

Chandra X-ray Center Seq Num: 600037

Instrument: HRC Obs ID: 277 Source: M31 - CENTER PI: Dr. Stephen Murray Title: MONITORING M31

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 10.660786 41.267738 243.583328 17.536722 13.889901 10.794214 41.247663 69.159088 9.781522 7.070381 10.763350 41.257714 56.897499 9.035390 6.297182 10.696391 41.274570 58.875000 9.431305 6.242508 10.718816 41.315097 48.916668 8.649004 5.655757 10.715863 41.518774 71.541664 13.544685 5.281899 10.576170 41.206656 39.897499 7.888689 5.057558 10.728819 41.267532 38.000000 7.612880 4.991540 10.702105 41.255926 36.916668 7.811997 4.725637 10.629731 41.272738 34.000000 7.300402 4.657278