Summary Page Created:Tue November 20, 2007 08:46 EST page: 1 of 3

Chandra X-ray Center Seq Num: 600059

Instrument: HRC Obs ID: 299 Source: M31 - North 2 PI: Dr. Stephen Murray Title: MONITORING M31

hrcf00299N004 full img2.fits hrcf00299N004 cntr img2.fits

Summary Page Created:Tue November 20, 2007 08:46 EST page: 2 of 3

Chandra X-ray Center Seq Num: 600059

Instrument: HRC Obs ID: 299 Source: M31 - North 2 PI: Dr. Stephen Murray Title: MONITORING M31

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-20T13:38:47 Date and time of file creation DATE-OBS 2000-08-18T11:06:26 Observation start date DATE-END 2000-08-18T11:37:59 Observation end date RA PNT 11.332230636852 Pointing RA DEC PNT 41.833861042303 Pointing Dec ROLL PNT 133.61975171954 Pointing Roll RA TARG 11.333333 Observer’s specified target RA DEC TARG 41.829722 Observer’s specified target Dec DEGAP hrciD1999-07- 22gaplookupN0003.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-20T13:45:37 Date and time of file creation DATE-OBS 2000-08-18T11:06:26 Observation start date DATE-END 2000-08-18T11:37:59 Observation end date INSTRUME HRC Instrument DETNAM HRC-I Detector GRATING NONE Grating OBJECT M31 - North 2 Source name TITLE MONITORING M31 Proposal title OBSERVER Dr. Stephen Murray Principal investigator OBS ID 299 Observation id SEQ NUM 600059 Sequence number RA NOM 11.332230636852 Nominal RA DEC NOM 41.833861042303 Nominal Dec ROLL NOM 133.61975171954 Nominal Roll

Summary Page Created:Tue November 20, 2007 08:46 EST page: 3 of 3

Chandra X-ray Center Seq Num: 600059

Instrument: HRC Obs ID: 299 Source: M31 - North 2 PI: Dr. Stephen Murray Title: MONITORING M31

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 11.439371 41.661734 234.625000 18.812540 12.471734 11.610797 42.032030 41.583332 12.164259 3.418485