Summary Page Created:Tue November 20, 2007 21:42 EST page: 1 of 3

Chandra X-ray Center Seq Num: 600061

Instrument: HRC Obs ID: 301 Source: M31 - North 2 PI: Dr. Stephen Murray Title: MONITORING M31

hrcf00301N005 full img2.fits hrcf00301N005 cntr img2.fits

Summary Page Created:Tue November 20, 2007 21:42 EST page: 2 of 3

Chandra X-ray Center Seq Num: 600061

Instrument: HRC Obs ID: 301 Source: M31 - North 2 PI: Dr. Stephen Murray Title: MONITORING M31

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-21T02:33:16 Date and time of file creation DATE-OBS 2000-10-12T05:05:40 Observation start date DATE-END 2000-10-12T05:33:44 Observation end date RA PNT 11.327003485422 Pointing RA DEC PNT 41.830474195504 Pointing Dec ROLL PNT 190.93486627299 Pointing Roll RA TARG 11.333333 Observer’s specified target RA DEC TARG 41.829722 Observer’s specified target Dec DEGAP hrciD1999-07- 22gaplookupN0003.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-21T02:41:02 Date and time of file creation DATE-OBS 2000-10-12T05:05:40 Observation start date DATE-END 2000-10-12T05:33:44 Observation end date INSTRUME HRC Instrument DETNAM HRC-I Detector GRATING NONE Grating OBJECT M31 - North 2 Source name TITLE MONITORING M31 Proposal title OBSERVER Dr. Stephen Murray Principal investigator OBS ID 301 Observation id SEQ NUM 600061 Sequence number RA NOM 11.327003485422 Nominal RA DEC NOM 41.830474195504 Nominal Dec ROLL NOM 190.93486627299 Nominal Roll

Summary Page Created:Tue November 20, 2007 21:42 EST page: 3 of 3

Chandra X-ray Center Seq Num: 600061

Instrument: HRC Obs ID: 301 Source: M31 - North 2 PI: Dr. Stephen Murray Title: MONITORING M31

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 11.439953 41.661612 245.708328 20.430079 12.026793 11.440005 41.662649 173.159088 19.587568 8.840255 11.441170 41.841606 29.958334 7.062166 4.242088 11.345785 41.528337 68.432144 18.928919 3.615217 11.732707 41.843042 69.871429 21.610899 3.233157 11.046192 41.739229 40.525265 12.695338 3.192138 11.241940 41.678476 24.385000 7.730172 3.154522