Summary Page Created:Thu May 31, 2007 22:55 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 600071

Instrument: ACIS Obs ID: 311 Source: M31 TRANSIENT TBD PI: Dr. Stephen Murray Title: M31 MONITORING (FOLLOWUP)

acisf00311N003 full img2.fits acisf00311N003 cntr img2.fits

Summary Page Created:Thu May 31, 2007 22:55 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 600071

Instrument: ACIS Obs ID: 311 Source: M31 TRANSIENT TBD PI: Dr. Stephen Murray Title: M31 MONITORING (FOLLOWUP)

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.10 ASCDS version number DATE 2007-06-01T02:36:03 Date and time of file creation DATE-OBS 2000-07-29T00:27:54 Observation start date DATE-END 2000-07-29T02:20:20 Observation end date RA PNT 10.687368729026 Pointing RA DEC PNT 41.28524955939 Pointing Dec ROLL PNT 122.67265431702 Pointing Roll RA TARG 10.685 Observer’s specified target RA DEC TARG 41.268972 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.2848053 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.10 ASCDS version number DATE 2007-06-01T02:54:23 Date and time of file creation DATE-OBS 2000-07-29T00:27:54 Observation start date DATE-END 2000-07-29T02:20:20 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-012367 Detector GRATING NONE Grating OBJECT M31 TRANSIENT TBD Source name TITLE M31 MONITORING (FOLLOWUP)

Proposal title

OBSERVER Dr. Stephen Murray Principal investigator OBS ID 311 Observation id SEQ NUM 600071 Sequence number RA NOM 10.687368729026 Nominal RA DEC NOM 41.28524955939 Nominal Dec ROLL NOM 122.67265431702 Nominal Roll

Summary Page Created:Thu May 31, 2007 22:55 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 600071

Instrument: ACIS Obs ID: 311 Source: M31 TRANSIENT TBD PI: Dr. Stephen Murray Title: M31 MONITORING (FOLLOWUP)

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 10.660803 41.267673 1143.142822 36.101433 31.664751 10.794281 41.247606 500.416656 24.240353 20.643951 10.702204 41.255853 442.714294 22.874655 19.353922 10.718860 41.315095 438.571442 23.085375 18.997805 10.617881 41.206381 421.954559 22.228436 18.982647 10.675752 41.268928 355.571442 20.516529 17.330975 10.728877 41.267556 353.571442 21.065199 16.784624 10.696560 41.274551 323.571442 19.677628 16.443621 10.905391 41.245511 295.124146 19.447254 15.175619 10.763450 41.257704 284.272736 18.903702 15.037939