Summary Page Created:Mon August 27, 2007 17:17 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 700106

Instrument: ACIS Obs ID: 434 Source: 3C 212 PI: Dr. Stephen Murray Title: OBSCURED QUASARS AND AGN

acisf00434N002 full img2.fits acisf00434N002 cntr img2.fits

Summary Page Created:Mon August 27, 2007 17:17 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 700106

Instrument: ACIS Obs ID: 434 Source: 3C 212 PI: Dr. Stephen Murray Title: OBSCURED QUASARS AND AGN

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.11 ASCDS version number DATE 2007-08-27T20:55:27 Date and time of file creation DATE-OBS 2000-10-26T08:10:51 Observation start date DATE-END 2000-10-26T14:22:31 Observation end date RA PNT 134.67614849586 Pointing RA DEC PNT 14.168359010522 Pointing Dec ROLL PNT 74.36088380006 Pointing Roll RA TARG 134.671667 Observer’s specified target RA DEC TARG 14.159444 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.2848053 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.11 ASCDS version number DATE 2007-08-27T21:16:24 Date and time of file creation DATE-OBS 2000-10-26T08:10:51 Observation start date DATE-END 2000-10-26T14:22:31 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-67 Detector GRATING NONE Grating OBJECT 3C 212 Source name TITLE OBSCURED QUASARS AND AGN Proposal title

OBSERVER Dr. Stephen Murray Principal investigator OBS ID 434 Observation id SEQ NUM 700106 Sequence number RA NOM 134.67614849586 Nominal RA DEC NOM 14.168359010522 Nominal Dec ROLL NOM 74.36088380006 Nominal Roll

Summary Page Created:Mon August 27, 2007 17:17 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 700106

Instrument: ACIS Obs ID: 434 Source: 3C 212 PI: Dr. Stephen Murray Title: OBSCURED QUASARS AND AGN

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 134.672733 14.162481 3820.857178 64.782104 58.980129 134.673667 14.138888 80.428574 10.711422 7.508673 134.655280 14.114206 60.636364 9.980281 6.075617 134.727238 14.328050 29.110344 9.265884 3.141670