Summary Page Created:Sat June 16, 2007 10:28 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 800171

Instrument: ACIS Obs ID: 2320 Source: A383 PI: DR. LEON VANSPEYBROECK Title: DETERMINATION OF H0/Q0

acisf02320N002 full img2.fits acisf02320N002 cntr img2.fits

Summary Page Created:Sat June 16, 2007 10:28 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 800171

Instrument: ACIS Obs ID: 2320 Source: A383 PI: DR. LEON VANSPEYBROECK Title: DETERMINATION OF H0/Q0

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.10 ASCDS version number DATE 2007-06-16T14:05:13 Date and time of file creation DATE-OBS 2000-11-16T07:23:38 Observation start date DATE-END 2000-11-16T13:20:39 Observation end date RA PNT 42.062761177799 Pointing RA DEC PNT -3.5508677172803 Pointing Dec ROLL PNT 337.20204123409 Pointing Roll RA TARG 42.01325 Observer’s specified target RA DEC TARG -3.527847 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.2848053 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.10 ASCDS version number DATE 2007-06-16T14:27:41 Date and time of file creation DATE-OBS 2000-11-16T07:23:38 Observation start date DATE-END 2000-11-16T13:20:39 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-01236 Detector GRATING NONE Grating OBJECT A383 Source name TITLE DETERMINATION OF H0/Q0 Proposal title OBSERVER DR. LEON VANSPEYBROECK Principal investigator OBS ID 2320 Observation id SEQ NUM 800171 Sequence number RA NOM 42.062761177799 Nominal RA DEC NOM -3.5508677172803 Nominal Dec ROLL NOM 337.20204123409 Nominal Roll

Summary Page Created:Sat June 16, 2007 10:28 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 800171

Instrument: ACIS Obs ID: 2320 Source: A383 PI: DR. LEON VANSPEYBROECK Title: DETERMINATION OF H0/Q0

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 42.044802 -3.593522 92.428574 12.422289 7.440543 41.971888 -3.534955 70.875000 10.119197 7.004014 42.065855 -3.645054 65.795456 10.472231 6.282850 42.091392 -3.573867 55.428570 9.314573 5.950737 42.092134 -3.609026 53.238636 8.951102 5.947719 41.938797 -3.620373 65.431816 11.225578 5.828815 41.910945 -3.612361 64.642502 12.358544 5.230592 42.069219 -3.579208 38.000000 7.612880 4.991540 42.023563 -3.542360 43.142857 8.764964 4.922194 41.993206 -3.507740 37.791668 8.396832 4.500705