Summary Page Created:Sat June 16, 2007 12:07 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 800172

Instrument: ACIS Obs ID: 2321 Source: A383 PI: DR. LEON VANSPEYBROECK Title: DETERMINATION OF H0/Q0

acisf02321N003 full img2.fits acisf02321N003 cntr img2.fits

Summary Page Created:Sat June 16, 2007 12:07 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 800172

Instrument: ACIS Obs ID: 2321 Source: A383 PI: DR. LEON VANSPEYBROECK Title: DETERMINATION OF H0/Q0

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.10 ASCDS version number DATE 2007-06-16T15:35:01 Date and time of file creation DATE-OBS 2000-11-16T15:56:08 Observation start date DATE-END 2000-11-16T21:47:26 Observation end date RA PNT 42.031709805797 Pointing RA DEC PNT -3.5378405265799 Pointing Dec ROLL PNT 336.44960834818 Pointing Roll RA TARG 42.01325 Observer’s specified target RA DEC TARG -3.527847 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.10 ASCDS version number DATE 2007-06-16T16:05:17 Date and time of file creation DATE-OBS 2000-11-16T15:56:08 Observation start date DATE-END 2000-11-16T21:47:26 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-012367 Detector GRATING NONE Grating OBJECT A383 Source name TITLE DETERMINATION OF H0/Q0 Proposal title OBSERVER DR. LEON VANSPEYBROECK Principal investigator OBS ID 2321 Observation id SEQ NUM 800172 Sequence number RA NOM 42.031709805797 Nominal RA DEC NOM -3.5378405265799 Nominal Dec ROLL NOM 336.44960834818 Nominal Roll

Summary Page Created:Sat June 16, 2007 12:07 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 800172

Instrument: ACIS Obs ID: 2321 Source: A383 PI: DR. LEON VANSPEYBROECK Title: DETERMINATION OF H0/Q0

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 41.971783 -3.534921 144.875000 14.082635 10.287493 42.044716 -3.593556 103.318184 11.750539 8.792633 41.854338 -3.634857 155.799103 18.133835 8.591625 42.023468 -3.542354 74.857140 10.790404 6.937381 42.091951 -3.609069 71.636360 10.577497 6.772525 41.910434 -3.612733 68.034088 10.885872 6.249760 42.054229 -3.616182 53.916668 8.971304 6.009903 42.091146 -3.573827 66.428574 11.206784 5.927532 41.802835 -3.741725 97.518272 20.084791 4.855330 42.119015 -3.604874 44.180000 9.405057 4.697473