Summary Page Created:Wed June 6, 2007 17:44 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 800030

Instrument: ACIS Obs ID: 522 Source: A209 PI: DR. LEON VANSPEYBROECK Title: DETERMINATION OF H0/Q0

acisf00522N002 full img2.fits acisf00522N002 cntr img2.fits

Summary Page Created:Wed June 6, 2007 17:44 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 800030

Instrument: ACIS Obs ID: 522 Source: A209 PI: DR. LEON VANSPEYBROECK Title: DETERMINATION OF H0/Q0

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.10 ASCDS version number DATE 2007-06-06T21:19:58 Date and time of file creation DATE-OBS 2000-09-09T09:50:41 Observation start date DATE-END 2000-09-09T13:19:20 Observation end date RA PNT 23.0178729459 Pointing RA DEC PNT -13.564236983756 Pointing Dec ROLL PNT 79.771714739322 Pointing Roll RA TARG 22.972117 Observer’s specified target RA DEC TARG -13.611458 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.10 ASCDS version number DATE 2007-06-06T21:43:51 Date and time of file creation DATE-OBS 2000-09-09T09:50:41 Observation start date DATE-END 2000-09-09T13:19:20 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-01236 Detector GRATING NONE Grating OBJECT A209 Source name TITLE DETERMINATION OF H0/Q0 Proposal title OBSERVER DR. LEON VANSPEYBROECK Principal investigator OBS ID 522 Observation id SEQ NUM 800030 Sequence number RA NOM 23.0178729459 Nominal RA DEC NOM -13.564236983756 Nominal Dec ROLL NOM 79.771714739322 Nominal Roll

Summary Page Created:Wed June 6, 2007 17:44 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 800030

Instrument: ACIS Obs ID: 522 Source: A209 PI: DR. LEON VANSPEYBROECK Title: DETERMINATION OF H0/Q0

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 22.889753 -13.634122 76.875000 11.139821 6.900918 23.079493 -13.632496 62.916668 9.520245 6.608724 22.910404 -13.467385 47.477272 8.965564 5.295515 22.736666 -13.475585 68.666664 13.155357 5.219674 22.928486 -13.497316 37.897499 7.740678 4.895889 22.790771 -13.458138 76.375000 15.975951 4.780623 22.903015 -13.464403 36.556820 8.373129 4.365969 22.754304 -13.353538 64.084442 16.586246 3.863710 22.696582 -13.463268 49.321808 14.556588 3.388281 23.110931 -13.501528 23.692499 7.054569 3.358462