Summary Page Created:Sat June 9, 2007 18:08 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 800036

Instrument: ACIS Obs ID: 528 Source: A520 PI: DR. LEON VANSPEYBROECK Title: DETERMINATION OF H0/Q0

acisf00528N002 full img2.fits acisf00528N002 cntr img2.fits

Summary Page Created:Sat June 9, 2007 18:08 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 800036

Instrument: ACIS Obs ID: 528 Source: A520 PI: DR. LEON VANSPEYBROECK Title: DETERMINATION OF H0/Q0

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.10 ASCDS version number DATE 2007-06-09T21:51:33 Date and time of file creation DATE-OBS 2000-10-10T12:40:55 Observation start date DATE-END 2000-10-10T15:48:32 Observation end date RA PNT 73.546437164551 Pointing RA DEC PNT 2.9766661993302 Pointing Dec ROLL PNT 83.907504499288 Pointing Roll RA TARG 73.538579 Observer’s specified target RA DEC TARG 2.922708 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.2848053 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.10 ASCDS version number DATE 2007-06-09T22:07:34 Date and time of file creation DATE-OBS 2000-10-10T12:40:55 Observation start date DATE-END 2000-10-10T15:48:32 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-01236 Detector GRATING NONE Grating OBJECT A520 Source name TITLE DETERMINATION OF H0/Q0 Proposal title OBSERVER DR. LEON VANSPEYBROECK Principal investigator OBS ID 528 Observation id SEQ NUM 800036 Sequence number RA NOM 73.546437164551 Nominal RA DEC NOM 2.9766661993302 Nominal Dec ROLL NOM 83.907504499288 Nominal Roll

Summary Page Created:Sat June 9, 2007 18:08 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 800036

Instrument: ACIS Obs ID: 528 Source: A520 PI: DR. LEON VANSPEYBROECK Title: DETERMINATION OF H0/Q0

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 73.674521 2.982095 47.875000 9.575507 4.999735 73.564708 3.026045 31.079546 7.054573 4.405589 73.298154 3.166271 56.325581 13.101693 4.299107 73.611169 3.049760 22.079546 6.250462 3.532466 73.727098 2.908699 35.166668 10.310297 3.410830 73.675215 2.982232 29.333334 9.463956 3.099479