Summary Page Created:Wed June 6, 2007 15:41 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 800041

Instrument: ACIS Obs ID: 533 Source: A773 PI: DR. LEON VANSPEYBROECK Title: DETERMINATION OF H0/Q0

acisf00533N002 full img2.fits acisf00533N002 cntr img2.fits

Summary Page Created:Wed June 6, 2007 15:41 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 800041

Instrument: ACIS Obs ID: 533 Source: A773 PI: DR. LEON VANSPEYBROECK Title: DETERMINATION OF H0/Q0

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.10 ASCDS version number DATE 2007-06-06T19:12:58 Date and time of file creation DATE-OBS 2000-09-05T01:50:02 Observation start date DATE-END 2000-09-05T05:19:41 Observation end date RA PNT 139.5762883251 Pointing RA DEC PNT 51.729528376901 Pointing Dec ROLL PNT 35.671875985018 Pointing Roll RA TARG 139.471683 Observer’s specified target RA DEC TARG 51.726597 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.2848053 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.10 ASCDS version number DATE 2007-06-06T19:40:35 Date and time of file creation DATE-OBS 2000-09-05T01:50:02 Observation start date DATE-END 2000-09-05T05:19:41 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-01236 Detector GRATING NONE Grating OBJECT A773 Source name TITLE DETERMINATION OF H0/Q0 Proposal title OBSERVER DR. LEON VANSPEYBROECK Principal investigator OBS ID 533 Observation id SEQ NUM 800041 Sequence number RA NOM 139.5762883251 Nominal RA DEC NOM 51.729528376901 Nominal Dec ROLL NOM 35.671875985018 Nominal Roll

Summary Page Created:Wed June 6, 2007 15:41 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 800041

Instrument: ACIS Obs ID: 533 Source: A773 PI: DR. LEON VANSPEYBROECK Title: DETERMINATION OF H0/Q0

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 139.618997 51.658891 117.000000 13.188435 8.871409 139.656463 51.658314 62.791668 9.942895 6.315230 139.613890 51.652859 56.142857 9.570412 5.866295 139.567795 51.721517 33.714287 7.591296 4.441177 139.822274 51.690950 37.872501 9.477796 3.995919 139.495253 51.720247 27.159090 6.902595 3.934620 139.422766 51.681685 30.385000 8.171556 3.718386 139.680572 51.648810 23.000000 6.223283 3.695799 139.573895 51.716203 23.000000 6.344512 3.625180 139.650976 51.755576 19.000000 5.708618 3.328301