Summary Page Created:Sun May 27, 2007 09:04 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 800043

Instrument: ACIS Obs ID: 535 Source: A907 PI: DR. LEON VANSPEYBROECK Title: DETERMINATION OF H0/Q0

acisf00535N003 full img2.fits acisf00535N003 cntr img2.fits

Summary Page Created:Sun May 27, 2007 09:04 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 800043

Instrument: ACIS Obs ID: 535 Source: A907 PI: DR. LEON VANSPEYBROECK Title: DETERMINATION OF H0/Q0

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.10 ASCDS version number DATE 2007-05-27T12:30:49 Date and time of file creation DATE-OBS 2000-06-29T02:23:37 Observation start date DATE-END 2000-06-29T05:55:11 Observation end date RA PNT 149.52779694248 Pointing RA DEC PNT -11.085709744702 Pointing Dec ROLL PNT 235.45988092281 Pointing Roll RA TARG 149.589 Observer’s specified target RA DEC TARG -11.061 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.2848053 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.10 ASCDS version number DATE 2007-05-27T13:03:31 Date and time of file creation DATE-OBS 2000-06-29T02:23:37 Observation start date DATE-END 2000-06-29T05:55:11 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-01236 Detector GRATING NONE Grating OBJECT A907 Source name TITLE DETERMINATION OF H0/Q0 Proposal title OBSERVER DR. LEON VANSPEYBROECK Principal investigator OBS ID 535 Observation id SEQ NUM 800043 Sequence number RA NOM 149.52779694248 Nominal RA DEC NOM -11.085709744702 Nominal Dec ROLL NOM 235.45988092281 Nominal Roll

Summary Page Created:Sun May 27, 2007 09:04 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 800043

Instrument: ACIS Obs ID: 535 Source: A907 PI: DR. LEON VANSPEYBROECK Title: DETERMINATION OF H0/Q0

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 149.672925 -11.073798 1222.806763 37.966915 32.207169 149.520351 -11.099996 30.000000 6.971125 4.303466 149.591864 -11.063821 87.714287 22.142212 3.961406 149.620217 -11.044951 25.159090 6.728503 3.739181 149.765687 -11.319297 64.880981 17.775499 3.650023 149.519962 -10.936580 26.397728 7.334949 3.598897 149.449352 -11.013403 22.897499 6.500649 3.522340 149.530073 -10.938842 24.795454 7.940438 3.122681 149.594505 -11.063227 45.142857 14.992144 3.011101