Summary Page Created:Wed May 30, 2007 09:41 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 800046

Instrument: ACIS Obs ID: 538 Source: A1423 PI: DR. LEON VANSPEYBROECK Title: DETERMINATION OF H0/Q0

acisf00538N003 full img2.fits acisf00538N003 cntr img2.fits

Summary Page Created:Wed May 30, 2007 09:41 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 800046

Instrument: ACIS Obs ID: 538 Source: A1423 PI: DR. LEON VANSPEYBROECK Title: DETERMINATION OF H0/Q0

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.10 ASCDS version number DATE 2007-05-30T13:16:34 Date and time of file creation DATE-OBS 2000-07-07T01:02:12 Observation start date DATE-END 2000-07-07T04:11:11 Observation end date RA PNT 179.2684364995 Pointing RA DEC PNT 33.564033356689 Pointing Dec ROLL PNT 259.41486509121 Pointing Roll RA TARG 179.322296 Observer’s specified target RA DEC TARG 33.611003 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.2848053 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.10 ASCDS version number DATE 2007-05-30T13:40:01 Date and time of file creation DATE-OBS 2000-07-07T01:02:12 Observation start date DATE-END 2000-07-07T04:11:11 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-01236 Detector GRATING NONE Grating OBJECT A1423 Source name TITLE DETERMINATION OF H0/Q0 Proposal title OBSERVER DR. LEON VANSPEYBROECK Principal investigator OBS ID 538 Observation id SEQ NUM 800046 Sequence number RA NOM 179.2684364995 Nominal RA DEC NOM 33.564033356689 Nominal Dec ROLL NOM 259.41486509121 Nominal Roll

Summary Page Created:Wed May 30, 2007 09:41 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 800046

Instrument: ACIS Obs ID: 538 Source: A1423 PI: DR. LEON VANSPEYBROECK Title: DETERMINATION OF H0/Q0

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 179.222858 33.529768 249.238632 17.112917 14.564357 179.353597 33.678614 54.750000 9.618404 5.692212 179.394013 33.454315 49.077499 9.842112 4.986481 179.141824 33.443964 41.590000 8.585583 4.844168 179.332054 33.658174 37.180000 8.970341 4.144770 179.322536 33.544845 27.857143 7.942266 3.507456 179.358342 33.406247 28.062069 8.234051 3.408051 179.232389 33.478987 20.000000 5.885465 3.398202 179.229371 33.631028 20.000000 6.051155 3.305154 179.123093 33.466192 26.282499 8.058732 3.261369