Summary Page Created:Sat November 25, 2006 01:56 EST page: 1 of 3

Chandra X-ray Center Seq Num: 200128

Instrument: ACIS Obs ID: 2404 Source: HD104237 PI: Professor Gordon Garmire Title: OBSERVATION OF SCO-CEN OUTLYERS

acisf02404N002 full img2.fits acisf02404N002 cntr img2.fits

Summary Page Created:Sat November 25, 2006 01:56 EST page: 2 of 3

Chandra X-ray Center Seq Num: 200128

Instrument: ACIS Obs ID: 2404 Source: HD104237 PI: Professor Gordon Garmire Title: OBSERVATION OF SCO-CEN OUTLYERS

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-11-25T06:33:23 Date and time of file creation DATE-OBS 2001-06-05T05:20:15 Observation start date DATE-END 2001-06-05T06:35:00 Observation end date RA PNT 179.95346142118 Pointing RA DEC PNT -78.217476389932 Pointing Dec ROLL PNT 281.77433031092 Pointing Roll RA TARG 180.02125 Observer’s specified target RA DEC TARG -78.193056 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.2848053 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-11-25T06:55:08 Date and time of file creation DATE-OBS 2001-06-05T05:20:15 Observation start date DATE-END 2001-06-05T06:35:00 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-012367 Detector GRATING NONE Grating OBJECT HD104237 Source name TITLE OBSERVATION OF SCO-CEN OUTLYERS

Proposal title

OBSERVER Professor Gordon Garmire Principal investigator OBS ID 2404 Observation id SEQ NUM 200128 Sequence number RA NOM 179.95346142118 Nominal RA DEC NOM -78.217476389932 Nominal Dec ROLL NOM 281.77433031092 Nominal Roll

Summary Page Created:Sat November 25, 2006 01:56 EST page: 3 of 3

Chandra X-ray Center Seq Num: 200128

Instrument: ACIS Obs ID: 2404 Source: HD104237 PI: Professor Gordon Garmire Title: OBSERVATION OF SCO-CEN OUTLYERS

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 180.021256 -78.192896 355.428558 21.434618 16.581987 180.034577 -78.194272 44.000000 8.055131 5.462357 180.038916 -78.195053 28.428572 7.463310 3.809111 180.980745 -78.064712 44.977272 12.954652 3.471901 181.450392 -78.172873 49.950165 14.489191 3.447409 181.437487 -78.316724 30.930233 9.411354 3.286480 181.347256 -78.083370 60.289036 19.256157 3.130897 180.468088 -78.311149 17.000000 5.488740 3.097250