Summary Page Created:Wed January 10, 2007 07:50 EST page: 1 of 3

Chandra X-ray Center Seq Num: 400121

Instrument: ACIS Obs ID: 1908 Source: XTE J1739-302 PI: Prof David Smith Title: XTE J1739-302 IN QUIESCENCE

acisf01908N002 full img2.fits acisf01908N002 cntr img2.fits

Summary Page Created:Wed January 10, 2007 07:50 EST page: 2 of 3

Chandra X-ray Center Seq Num: 400121

Instrument: ACIS Obs ID: 1908 Source: XTE J1739-302 PI: Prof David Smith Title: XTE J1739-302 IN QUIESCENCE

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.10 ASCDS version number DATE 2007-01-10T12:32:50 Date and time of file creation DATE-OBS 2001-10-15T14:42:59 Observation start date DATE-END 2001-10-15T16:32:14 Observation end date RA PNT 264.7374037691 Pointing RA DEC PNT -30.314069322556 Pointing Dec ROLL PNT 264.63321756811 Pointing Roll RA TARG 264.74 Observer’s specified target RA DEC TARG -30.31 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.10 ASCDS version number DATE 2007-01-10T12:49:17 Date and time of file creation DATE-OBS 2001-10-15T14:42:59 Observation start date DATE-END 2001-10-15T16:32:14 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-012367 Detector GRATING NONE Grating OBJECT XTE J1739-302 Source name TITLE XTE J1739-302 IN QUIESCENCE Proposal title OBSERVER Prof David Smith Principal investigator OBS ID 1908 Observation id SEQ NUM 400121 Sequence number RA NOM 264.7374037691 Nominal RA DEC NOM -30.314069322556 Nominal Dec ROLL NOM 264.63321756811 Nominal Roll

Summary Page Created:Wed January 10, 2007 07:50 EST page: 3 of 3

Chandra X-ray Center Seq Num: 400121

Instrument: ACIS Obs ID: 1908 Source: XTE J1739-302 PI: Prof David Smith Title: XTE J1739-302 IN QUIESCENCE

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 264.798106 -30.343800 1167.602295 37.464947 31.165192 265.104858 -30.243149 127.349731 22.041990 5.777597 265.066741 -30.362457 90.125000 19.882723 4.532830 265.101584 -30.260859 107.016609 24.210318 4.420290 265.092175 -30.364531 81.594681 19.594765 4.164106 265.071433 -30.237396 75.041069 20.269493 3.702168 265.020404 -30.231558 57.579311 16.410118 3.508769 265.020416 -30.231557 57.579311 16.410118 3.508769 265.047606 -30.237498 75.916664 22.390339 3.390599 265.093935 -30.326524 80.252495 24.117228 3.327600