Summary Page Created:Mon December 11, 2006 07:26 EST page: 1 of 3

Chandra X-ray Center Seq Num: 400130

Instrument: ACIS Obs ID: 1917 Source: SAX J1818.7+1424 PI: PROF FRANK VERBUNT Title: X-RAY BURSTERS WITH LOW PERSISTENT X-RAY LUMINOSITIES

acisf01917N002 full img2.fits acisf01917N002 cntr img2.fits

Summary Page Created:Mon December 11, 2006 07:26 EST page: 2 of 3

Chandra X-ray Center Seq Num: 400130

Instrument: ACIS Obs ID: 1917 Source: SAX J1818.7+1424 PI: PROF FRANK VERBUNT Title: X-RAY BURSTERS WITH LOW PERSISTENT X-RAY LUMINOSITIES

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-12-11T11:59:17 Date and time of file creation DATE-OBS 2001-07-02T04:02:50 Observation start date DATE-END 2001-07-02T05:49:55 Observation end date RA PNT 274.65001095986 Pointing RA DEC PNT 14.39936577301 Pointing Dec ROLL PNT 189.99391908452 Pointing Roll RA TARG 274.683333 Observer’s specified target RA DEC TARG 14.403333 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.60722351 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-12-11T12:25:49 Date and time of file creation DATE-OBS 2001-07-02T04:02:50 Observation start date DATE-END 2001-07-02T05:49:55 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-235678 Detector GRATING NONE Grating OBJECT SAX J1818.7+1424 Source name TITLE X-RAY BURSTERS WITH LOW PERSISTENT X-RAY LUMINOSITIES

Proposal tit

OBSERVER PROF FRANK VERBUNT Principal investigator OBS ID 1917 Observation id SEQ NUM 400130 Sequence number RA NOM 274.65001095986 Nominal RA DEC NOM 14.39936577301 Nominal Dec ROLL NOM 189.99391908452 Nominal Roll

Summary Page Created:Mon December 11, 2006 07:26 EST page: 3 of 3

Chandra X-ray Center Seq Num: 400130

Instrument: ACIS Obs ID: 1917 Source: SAX J1818.7+1424 PI: PROF FRANK VERBUNT Title: X-RAY BURSTERS WITH LOW PERSISTENT X-RAY LUMINOSITIES

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 274.633667 14.369228 50.714287 8.786088 5.772112 274.326989 14.405096 107.372093 21.215168 5.061100 274.656917 14.379037 37.428570 8.136259 4.600219 274.384971 14.290274 102.375000 22.458651 4.558377 274.352199 14.283660 87.837212 21.121704 4.158623 274.390366 14.291431 83.965912 20.679909 4.060265 274.339972 14.334303 92.621262 22.820387 4.058707 274.362810 14.413409 82.458336 20.587458 4.005270 274.661052 14.383009 30.428572 7.619089 3.993728 274.738946 14.541204 28.020689 7.247336 3.866343