Summary Page Created:Tue November 20, 2007 21:51 EST page: 1 of 3

Chandra X-ray Center Seq Num: 400131

Instrument: HRC Obs ID: 1918 Source: GRS 1758-258 PI: Dr. William Heindl Title: A SEARCH FOR X-RAY JETS IN TWO MICRO-QUASARS

hrcf01918N004 full img2.fits hrcf01918N004 cntr img2.fits

Summary Page Created:Tue November 20, 2007 21:51 EST page: 2 of 3

Chandra X-ray Center Seq Num: 400131

Instrument: HRC Obs ID: 1918 Source: GRS 1758-258 PI: Dr. William Heindl Title: A SEARCH FOR X-RAY JETS IN TWO MICRO-QUASARS

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-21T02:33:56 Date and time of file creation DATE-OBS 2000-10-27T08:27:52 Observation start date DATE-END 2000-10-27T11:28:52 Observation end date RA PNT 270.30304061655 Pointing RA DEC PNT -25.745351303938 Pointing Dec ROLL PNT 268.53943881604 Pointing Roll RA TARG 270.305 Observer’s specified target RA DEC TARG -25.741389 Observer’s specified target Dec DEGAP hrciD1999-07- 22gaplookupN0003.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-21T02:50:15 Date and time of file creation DATE-OBS 2000-10-27T08:27:52 Observation start date DATE-END 2000-10-27T11:28:52 Observation end date INSTRUME HRC Instrument DETNAM HRC-I Detector GRATING NONE Grating OBJECT GRS 1758-258 Source name TITLE A SEARCH FOR X-RAY JETS IN TWO MICRO-QUASARS

Proposal title

OBSERVER Dr. William Heindl Principal investigator OBS ID 1918 Observation id SEQ NUM 400131 Sequence number RA NOM 270.30304061655 Nominal RA DEC NOM -25.745351303938 Nominal Dec ROLL NOM 268.53943881604 Nominal Roll

Summary Page Created:Tue November 20, 2007 21:51 EST page: 3 of 3

Chandra X-ray Center Seq Num: 400131

Instrument: HRC Obs ID: 1918 Source: GRS 1758-258 PI: Dr. William Heindl Title: A SEARCH FOR X-RAY JETS IN TWO MICRO-QUASARS

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 270.301609 -25.743396 35715.042969 202.886414 176.034668 270.275418 -25.650903 47.715908 9.338913 5.109364 270.252635 -26.047558 162.811600 34.876556 4.668225 270.440474 -25.511030 111.033356 24.911394 4.457131 270.661039 -25.724344 160.940201 36.770905 4.376835 270.492880 -25.920240 92.458336 23.321104 3.964578 269.952972 -25.697377 134.518280 33.975586 3.959263 270.588572 -25.650721 93.220978 23.606010 3.949036 269.996859 -25.803479 132.208328 33.718384 3.920957 270.173928 -25.931748 82.531563 21.215399 3.890173