Summary Page Created:Mon December 11, 2006 16:09 EST page: 1 of 3

Chandra X-ray Center Seq Num: 500103

Instrument: ACIS Obs ID: 1037 Source: G74.9+1.2 PI: Professor Gordon Garmire Title: G0.9+0.1 AND G74.9+1.2

acisf01037N002 full img2.fits acisf01037N002 cntr img2.fits

Summary Page Created:Mon December 11, 2006 16:09 EST page: 2 of 3

Chandra X-ray Center Seq Num: 500103

Instrument: ACIS Obs ID: 1037 Source: G74.9+1.2 PI: Professor Gordon Garmire Title: G0.9+0.1 AND G74.9+1.2

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-12-11T20:45:37 Date and time of file creation DATE-OBS 2001-07-08T00:36:46 Observation start date DATE-END 2001-07-08T06:06:03 Observation end date RA PNT 303.96097023553 Pointing RA DEC PNT 37.232496792692 Pointing Dec ROLL PNT 162.58415554322 Pointing Roll RA TARG 304.0 Observer’s specified target RA DEC TARG 37.220833 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.2848053 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-12-11T21:08:50 Date and time of file creation DATE-OBS 2001-07-08T00:36:46 Observation start date DATE-END 2001-07-08T06:06:03 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-235678 Detector GRATING NONE Grating OBJECT G74.9+1.2 Source name TITLE G0.9+0.1 AND G74.9+1.2 Proposal title OBSERVER Professor Gordon Garmire Principal investigator OBS ID 1037 Observation id SEQ NUM 500103 Sequence number RA NOM 303.96097023553 Nominal RA DEC NOM 37.232496792692 Nominal Dec ROLL NOM 162.58415554322 Nominal Roll

Summary Page Created:Mon December 11, 2006 16:09 EST page: 3 of 3

Chandra X-ray Center Seq Num: 500103

Instrument: ACIS Obs ID: 1037 Source: G74.9+1.2 PI: Professor Gordon Garmire Title: G0.9+0.1 AND G74.9+1.2

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 303.903927 37.189745 1166.125000 39.439461 29.567467 303.869776 37.183172 554.416687 27.511879 20.151901 303.627575 37.352799 723.408020 56.518585 12.799472 303.615371 37.381146 457.259125 41.349735 11.058332 303.943440 37.237024 157.857147 14.389357 10.970409 303.573996 37.264843 423.734222 45.662693 9.279658 304.038385 37.186571 116.714287 17.855289 6.536678 303.599392 37.336445 298.239197 46.391983 6.428679 303.651398 37.373255 263.250000 42.440975 6.202732 303.637030 37.245731 181.482758 31.328218 5.792949