Summary Page Created:Wed January 3, 2007 16:24 EST page: 1 of 3

Chandra X-ray Center Seq Num: 500104

Instrument: HRC Obs ID: 1038 Source: CAS-A PI: Dr Stephen Murray Title: EXPANSION OF THE SNR CAS-A

hrcf01038N002 full img2.fits hrcf01038N002 cntr img2.fits

Summary Page Created:Wed January 3, 2007 16:24 EST page: 2 of 3

Chandra X-ray Center Seq Num: 500104

Instrument: HRC Obs ID: 1038 Source: CAS-A PI: Dr Stephen Murray Title: EXPANSION OF THE SNR CAS-A

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 Processing system revision DATE 2007-01-03T16:31:16 Date and time of file creation DATE-OBS 2001-09-19T04:59:00 Observation start date DATE-END 2001-09-19T19:26:02 Observation end date RA PNT 350.85684613579 Pointing RA DEC PNT 58.811299380496 Pointing Dec ROLL PNT 186.64411715664 Pointing Roll RA TARG 350.866042 Observer’s specified target RA DEC TARG 58.811694 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 Processing system revision DATE 2007-01-03T21:18:09 Date and time of file creation DATE-OBS 2001-09-19T04:59:00 Observation start date DATE-END 2001-09-19T19:26:02 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT CAS-A Source name TITLE EXPANSION OF THE SNR CAS- A Proposal title

OBSERVER Dr Stephen Murray Principal investigator OBS ID 1038 Observation id SEQ NUM 500104 Sequence number RA NOM 350.85684613579 Nominal RA DEC NOM 58.811299380496 Nominal Dec ROLL NOM 186.64411715664 Nominal Roll

Summary Page Created:Wed January 3, 2007 16:24 EST page: 3 of 3

Chandra X-ray Center Seq Num: 500104

Instrument: HRC Obs ID: 1038 Source: CAS-A PI: Dr Stephen Murray Title: EXPANSION OF THE SNR CAS-A

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 350.848432 58.839909 3217.818115 96.525383 33.336498 350.866459 58.811804 1222.750000 40.575169 30.135426 350.853415 58.840550 2171.272705 82.318069 26.376625 351.428317 58.886758 2540.300781 107.327293 23.668732 351.450393 58.792830 2211.625977 95.766975 23.093826 350.886480 58.796865 1646.416626 80.943672 20.340277 350.870227 58.828690 1091.416626 53.909382 20.245394 350.952166 58.818198 1039.333374 52.959946 19.624895 350.871678 58.840699 1455.750000 74.733063 19.479330 351.439858 58.848732 1957.695557 113.985191 17.174999