Summary Page Created:Wed November 29, 2006 07:46 EST page: 1 of 3

Chandra X-ray Center Seq Num: 500110

Instrument: ACIS Obs ID: 1044 Source: SN1987A PI: Professor Gordon Garmire Title: SN1987A MONITORING

acisf01044N002 full img2.fits acisf01044N002 cntr img2.fits

Summary Page Created:Wed November 29, 2006 07:46 EST page: 2 of 3

Chandra X-ray Center Seq Num: 500110

Instrument: ACIS Obs ID: 1044 Source: SN1987A PI: Professor Gordon Garmire Title: SN1987A MONITORING

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-11-29T12:11:38 Date and time of file creation DATE-OBS 2001-04-25T16:48:28 Observation start date DATE-END 2001-04-25T22:15:55 Observation end date RA PNT 83.845496814548 Pointing RA DEC PNT -69.275762700381 Pointing Dec ROLL PNT 228.89030026293 Pointing Roll RA TARG 83.867083 Observer’s specified target RA DEC TARG -69.269667 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.2848053 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-11-29T12:45:07 Date and time of file creation DATE-OBS 2001-04-25T16:48:28 Observation start date DATE-END 2001-04-25T22:15:55 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-235678 Detector GRATING NONE Grating OBJECT SN1987A Source name TITLE SN1987A MONITORING Proposal title OBSERVER Professor Gordon Garmire Principal investigator OBS ID 1044 Observation id SEQ NUM 500110 Sequence number RA NOM 83.845496814548 Nominal RA DEC NOM -69.275762700381 Nominal Dec ROLL NOM 228.89030026293 Nominal Roll

Summary Page Created:Wed November 29, 2006 07:46 EST page: 3 of 3

Chandra X-ray Center Seq Num: 500110

Instrument: ACIS Obs ID: 1044 Source: SN1987A PI: Professor Gordon Garmire Title: SN1987A MONITORING

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 83.866670 -69.269744 1634.000000 44.467487 36.745949 83.154909 -69.464721 390.604645 50.077950 7.799933 83.396372 -69.543277 355.418610 48.233120 7.368767 84.237231 -69.224041 77.034088 11.334784 6.796256 83.304473 -69.516288 284.126251 48.190033 5.895955 83.412799 -69.158298 85.041664 15.061854 5.646162 83.248379 -69.497142 268.790710 50.276447 5.346255 83.209903 -69.483992 268.823914 51.743294 5.195339 83.208288 -69.438996 225.333328 44.372990 5.078165 83.490706 -69.515536 176.409088 36.448025 4.840018