Summary Page Created:Thu December 14, 2006 09:21 EST page: 1 of 3

Chandra X-ray Center Seq Num: 500130

Instrument: HRC Obs ID: 1953 Source: CXOUJ112439.4-591622 PI: Prof. John Hughes Title: SEARCHING FOR THE PULSED X-RAY EMISSION FROM THE COMPACT REMNANT IN

G292.0+1.8

hrcf01953N002 full img2.fits hrcf01953N002 cntr img2.fits

Summary Page Created:Thu December 14, 2006 09:21 EST page: 2 of 3

Chandra X-ray Center Seq Num: 500130

Instrument: HRC Obs ID: 1953 Source: CXOUJ112439.4-591622 PI: Prof. John Hughes Title: SEARCHING FOR THE PULSED X-RAY EMISSION FROM THE COMPACT REMNANT IN

G292.0+1.8

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 Processing system revision DATE 2006-12-14T09:36:14 Date and time of file creation DATE-OBS 2001-07-14T21:37:53 Observation start date DATE-END 2001-07-15T11:53:59 Observation end date RA PNT 171.15805894695 Pointing RA DEC PNT -59.27628524096 Pointing Dec ROLL PNT 231.3729525013 Pointing Roll RA TARG 171.164167 Observer’s specified target RA DEC TARG -59.272667 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 Processing system revision DATE 2006-12-14T14:15:26 Date and time of file creation DATE-OBS 2001-07-14T21:37:53 Observation start date DATE-END 2001-07-15T11:53:59 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT CXOUJ112439.4-591622 Source name TITLE SEARCHING FOR THE PULSED X-RAY EMISSION FROM THE COMPACT REMNANT IN G292.0+1.8

Proposal title

OBSERVER Prof. John Hughes Principal investigator OBS ID 1953 Observation id SEQ NUM 500130 Sequence number RA NOM 171.15805894695 Nominal RA DEC NOM -59.27628524096 Nominal Dec ROLL NOM 231.3729525013 Nominal Roll

Summary Page Created:Thu December 14, 2006 09:21 EST page: 3 of 3

Chandra X-ray Center Seq Num: 500130

Instrument: HRC Obs ID: 1953 Source: CXOUJ112439.4-591622 PI: Prof. John Hughes Title: SEARCHING FOR THE PULSED X-RAY EMISSION FROM THE COMPACT REMNANT IN

G292.0+1.8

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 171.458359 -59.013334 2977.484863 117.467979 25.347204 171.604168 -59.069315 2208.400879 106.774994 20.682755 171.163327 -59.272056 679.875000 35.990509 18.890398 171.543860 -59.044609 2070.438477 134.662842 15.374978 171.569619 -59.056742 1977.652710 134.890320 14.661190 171.506837 -59.031655 2000.990234 138.645691 14.432401 170.795977 -59.441968 1007.208313 89.682007 11.230885 171.432241 -59.030466 1306.875000 123.891777 10.548521 171.578380 -59.087558 1185.375000 114.602119 10.343395 170.941112 -59.494991 853.416687 86.974167 9.812301