Summary Page Created:Sat June 16, 2007 17:12 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 600119

Instrument: ACIS Obs ID: 1562 Source: AC114 PI: Prof. Gordon Garmire Title: OBSERVE DISTAND X-RAY CLUSTER AC114

acisf01562N002 full img2.fits acisf01562N002 cntr img2.fits

Summary Page Created:Sat June 16, 2007 17:12 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 600119

Instrument: ACIS Obs ID: 1562 Source: AC114 PI: Prof. Gordon Garmire Title: OBSERVE DISTAND X-RAY CLUSTER AC114

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.10 ASCDS version number DATE 2007-06-16T20:31:51 Date and time of file creation DATE-OBS 2000-11-17T06:04:36 Observation start date DATE-END 2000-11-18T02:59:42 Observation end date RA PNT 344.7170036981 Pointing RA DEC PNT -34.828960187313 Pointing Dec ROLL PNT 298.35096142685 Pointing Roll RA TARG 344.702083 Observer’s specified target RA DEC TARG -34.802389 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.10 ASCDS version number DATE 2007-06-16T21:09:50 Date and time of file creation DATE-OBS 2000-11-17T06:04:36 Observation start date DATE-END 2000-11-18T02:59:42 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-235678 Detector GRATING NONE Grating OBJECT AC114 Source name TITLE OBSERVE DISTAND X-RAY CLUSTER AC114

Proposal title

OBSERVER Prof. Gordon Garmire Principal investigator OBS ID 1562 Observation id SEQ NUM 600119 Sequence number RA NOM 344.7170036981 Nominal RA DEC NOM -34.828960187313 Nominal Dec ROLL NOM 298.35096142685 Nominal Roll

Summary Page Created:Sat June 16, 2007 17:12 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 600119

Instrument: ACIS Obs ID: 1562 Source: AC114 PI: Prof. Gordon Garmire Title: OBSERVE DISTAND X-RAY CLUSTER AC114

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 344.720434 -34.812869 1178.142822 36.909863 31.919458 344.606929 -34.696669 885.627502 37.779213 23.442190 344.829590 -35.123424 1777.176025 92.381203 19.237421 344.738421 -34.970125 409.238647 25.179415 16.252905 344.654630 -34.843512 308.909088 19.985601 15.456582 344.956679 -35.064818 1364.621216 93.417641 14.607747 344.636128 -34.660934 394.363647 27.631029 14.272491 344.761544 -34.788334 261.511353 18.420424 14.196815 344.693965 -34.670594 321.467499 24.610493 13.062213 344.786503 -34.986359 308.731049 24.148079 12.784911