Summary Page Created:Wed November 21, 2007 02:58 EST page: 1 of 3

Chandra X-ray Center Seq Num: 600122

Instrument: HRC Obs ID: 1565 Source: M31 - SOUTH 2 PI: Dr. Stephen Murray Title: HRC MONITORING OF M31

hrcf01565N004 full img2.fits hrcf01565N004 cntr img2.fits

Summary Page Created:Wed November 21, 2007 02:58 EST page: 2 of 3

Chandra X-ray Center Seq Num: 600122

Instrument: HRC Obs ID: 1565 Source: M31 - SOUTH 2 PI: Dr. Stephen Murray Title: HRC MONITORING OF M31

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-21T07:48:39 Date and time of file creation DATE-OBS 2001-01-31T23:48:14 Observation start date DATE-END 2001-02-01T00:18:53 Observation end date RA PNT 10.114990367182 Pointing RA DEC PNT 40.665365732691 Pointing Dec ROLL PNT 306.15169278399 Pointing Roll RA TARG 10.1125 Observer’s specified target RA DEC TARG 40.67 Observer’s specified target Dec DEGAP hrciD1999-07- 22gaplookupN0003.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-21T07:57:14 Date and time of file creation DATE-OBS 2001-01-31T23:48:14 Observation start date DATE-END 2001-02-01T00:18:53 Observation end date INSTRUME HRC Instrument DETNAM HRC-I Detector GRATING NONE Grating OBJECT M31 - SOUTH 2 Source name TITLE HRC MONITORING OF M31 Proposal title OBSERVER Dr. Stephen Murray Principal investigator OBS ID 1565 Observation id SEQ NUM 600122 Sequence number RA NOM 10.114990367182 Nominal RA DEC NOM 40.665365732691 Nominal Dec ROLL NOM 306.15169278399 Nominal Roll

Summary Page Created:Wed November 21, 2007 02:58 EST page: 3 of 3

Chandra X-ray Center Seq Num: 600122

Instrument: HRC Obs ID: 1565 Source: M31 - SOUTH 2 PI: Dr. Stephen Murray Title: HRC MONITORING OF M31

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 10.084619 40.732840 43.000000 7.983408 5.386171 10.056858 40.834518 50.158619 11.222664 4.469404 10.328081 40.392725 64.970100 17.954472 3.618603 10.056430 40.835361 40.943180 11.721704 3.492938 9.836915 40.911104 79.710960 23.806950 3.348222 10.180389 40.408186 46.839809 14.094233 3.323332 10.461334 40.755770 51.761364 15.614352 3.314986 10.434005 40.644525 39.764706 12.597451 3.156568 9.977812 40.845708 36.996429 11.745654 3.149797 10.103298 40.475110 33.958332 10.834035 3.134412