Summary Page Created:Tue November 20, 2007 10:05 EST page: 1 of 3

Chandra X-ray Center Seq Num: 600127

Instrument: HRC Obs ID: 1570 Source: M31 - CENTER PI: Dr. Stephen Murray Title: HRC MONITORING OF M31

hrcf01570N003 full img2.fits hrcf01570N003 cntr img2.fits

Summary Page Created:Tue November 20, 2007 10:05 EST page: 2 of 3

Chandra X-ray Center Seq Num: 600127

Instrument: HRC Obs ID: 1570 Source: M31 - CENTER PI: Dr. Stephen Murray Title: HRC MONITORING OF M31

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-20T14:57:02 Date and time of file creation DATE-OBS 2001-06-10T22:13:00 Observation start date DATE-END 2001-06-10T22:38:10 Observation end date RA PNT 10.685923443591 Pointing RA DEC PNT 41.2730986313 Pointing Dec ROLL PNT 94.691216191688 Pointing Roll RA TARG 10.685 Observer’s specified target RA DEC TARG 41.268972 Observer’s specified target Dec DEGAP hrciD1999-07- 22gaplookupN0003.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-20T15:04:41 Date and time of file creation DATE-OBS 2001-06-10T22:13:00 Observation start date DATE-END 2001-06-10T22:38:10 Observation end date INSTRUME HRC Instrument DETNAM HRC-I Detector GRATING NONE Grating OBJECT M31 - CENTER Source name TITLE HRC MONITORING OF M31 Proposal title OBSERVER Dr. Stephen Murray Principal investigator OBS ID 1570 Observation id SEQ NUM 600127 Sequence number RA NOM 10.685923443591 Nominal RA DEC NOM 41.2730986313 Nominal Dec ROLL NOM 94.691216191688 Nominal Roll

Summary Page Created:Tue November 20, 2007 10:05 EST page: 3 of 3

Chandra X-ray Center Seq Num: 600127

Instrument: HRC Obs ID: 1570 Source: M31 - CENTER PI: Dr. Stephen Murray Title: HRC MONITORING OF M31

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 10.660801 41.267671 211.333328 16.974705 12.449897 10.595588 41.259724 91.142860 11.426929 7.976146 10.715773 41.518724 113.916664 14.418616 7.900666 10.718896 41.315122 66.916664 9.753003 6.861135 10.794025 41.247699 52.916668 8.907916 5.940409 10.718787 41.261134 50.079544 8.468115 5.913895 10.728799 41.267572 50.159092 8.617595 5.820544 10.702177 41.255887 38.958332 7.769936 5.013984 10.696523 41.274527 36.958332 7.619361 4.850582 10.554964 41.309947 36.692501 8.062160 4.551199