Summary Page Created:Wed January 3, 2007 09:41 EST page: 1 of 3

Chandra X-ray Center Seq Num: 700369

Instrument: ACIS Obs ID: 2179 Source: PSS 0059+0003 PI: Dr. Jill Bechtold Title: SURVEY OF RADIO QUIET Z>4 QUASARS

acisf02179N002 full img2.fits acisf02179N002 cntr img2.fits

Summary Page Created:Wed January 3, 2007 09:41 EST page: 2 of 3

Chandra X-ray Center Seq Num: 700369

Instrument: ACIS Obs ID: 2179 Source: PSS 0059+0003 PI: Dr. Jill Bechtold Title: SURVEY OF RADIO QUIET Z>4 QUASARS

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2007-01-03T14:26:04 Date and time of file creation DATE-OBS 2001-09-18T02:49:35 Observation start date DATE-END 2001-09-18T03:57:50 Observation end date RA PNT 14.845834312323 Pointing RA DEC PNT 0.059847760359683 Pointing Dec ROLL PNT 95.943127515186 Pointing Roll RA TARG 14.845 Observer’s specified target RA DEC TARG 0.050278 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2007-01-03T14:40:11 Date and time of file creation DATE-OBS 2001-09-18T02:49:35 Observation start date DATE-END 2001-09-18T03:57:50 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-235678 Detector GRATING NONE Grating OBJECT PSS 0059+0003 Source name TITLE SURVEY OF RADIO QUIET Z>4 QUASARS

Proposal title

OBSERVER Dr. Jill Bechtold Principal investigator OBS ID 2179 Observation id SEQ NUM 700369 Sequence number RA NOM 14.845834312323 Nominal RA DEC NOM 0.059847760359683 Nominal Dec ROLL NOM 95.943127515186 Nominal Roll

Summary Page Created:Wed January 3, 2007 09:41 EST page: 3 of 3

Chandra X-ray Center Seq Num: 700369

Instrument: ACIS Obs ID: 2179 Source: PSS 0059+0003 PI: Dr. Jill Bechtold Title: SURVEY OF RADIO QUIET Z>4 QUASARS

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 14.772948 0.114445 325.708344 22.398891 14.541270 14.849409 -0.022281 38.916668 7.958683 4.889838 14.871722 0.368549 99.289040 20.311041 4.888427 14.794174 0.361363 79.129570 19.087852 4.145546 14.773385 0.360430 69.358803 18.616350 3.725693 14.826965 0.365367 67.511627 18.431425 3.662854 14.872738 0.374124 54.242687 15.266232 3.553116 14.851968 0.031418 21.000000 6.150888 3.414141 14.780016 0.327889 60.666668 18.269224 3.320703 14.751187 0.348164 48.214287 15.637932 3.083163