Summary Page Created:Fri December 8, 2006 03:57 EST page: 1 of 3

Chandra X-ray Center Seq Num: 800121

Instrument: ACIS Obs ID: 1653 Source: ABELL 2163 PI: Dr. Stephen Murray Title: DEEP X-RAY IMAGE OF ABELL 2163

acisf01653N002 full img2.fits acisf01653N002 cntr img2.fits

Summary Page Created:Fri December 8, 2006 03:57 EST page: 2 of 3

Chandra X-ray Center Seq Num: 800121

Instrument: ACIS Obs ID: 1653 Source: ABELL 2163 PI: Dr. Stephen Murray Title: DEEP X-RAY IMAGE OF ABELL 2163

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-12-08T08:05:54 Date and time of file creation DATE-OBS 2001-06-16T11:39:11 Observation start date DATE-END 2001-06-17T07:58:27 Observation end date RA PNT 243.95646832054 Pointing RA DEC PNT -6.202793756047 Pointing Dec ROLL PNT 227.72327554318 Pointing Roll RA TARG 243.9407 Observer’s specified target RA DEC TARG -6.148611 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-12-08T08:54:46 Date and time of file creation DATE-OBS 2001-06-16T11:39:11 Observation start date DATE-END 2001-06-17T07:58:27 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-01236 Detector GRATING NONE Grating OBJECT ABELL 2163 Source name TITLE DEEP X-RAY IMAGE OF ABELL 2163

Proposal title

OBSERVER Dr. Stephen Murray Principal investigator OBS ID 1653 Observation id SEQ NUM 800121 Sequence number RA NOM 243.95646832054 Nominal RA DEC NOM -6.202793756047 Nominal Dec ROLL NOM 227.72327554318 Nominal Roll

Summary Page Created:Fri December 8, 2006 03:57 EST page: 3 of 3

Chandra X-ray Center Seq Num: 800121

Instrument: ACIS Obs ID: 1653 Source: ABELL 2163 PI: Dr. Stephen Murray Title: DEEP X-RAY IMAGE OF ABELL 2163

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 243.927160 -6.323249 908.045471 33.511749 27.096331 244.025225 -6.218544 196.142853 16.431032 11.937343 243.981293 -6.211720 140.285721 13.983684 10.032101 243.973710 -6.238833 125.428574 12.811134 9.790590 244.113676 -6.210553 184.029999 19.947981 9.225494 243.851984 -6.151254 149.268967 16.427214 9.086688 243.915261 -6.293090 120.034088 13.250413 9.058894 244.098413 -6.230762 129.897720 16.069012 8.083741 244.014841 -6.255814 98.000000 12.376537 7.918208 243.863919 -6.269765 109.052498 13.807411 7.898113