Summary Page Created:Thu November 2, 2006 08:20 EST page: 1 of 3

Chandra X-ray Center Seq Num: 800131

Instrument: ACIS Obs ID: 1663 Source: A1689 PI: DR. LEON VANSPEYBROECK Title: DETERMINATION OF H0 AND Q0, 2000 PART 1

acisf01663N002 full img2.fits acisf01663N002 cntr img2.fits

Summary Page Created:Thu November 2, 2006 08:20 EST page: 2 of 3

Chandra X-ray Center Seq Num: 800131

Instrument: ACIS Obs ID: 1663 Source: A1689 PI: DR. LEON VANSPEYBROECK Title: DETERMINATION OF H0 AND Q0, 2000 PART 1

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-11-02T13:01:46 Date and time of file creation DATE-OBS 2001-01-07T08:19:38 Observation start date DATE-END 2001-01-07T11:52:19 Observation end date RA PNT 197.89539921738 Pointing RA DEC PNT -1.2863567204577 Pointing Dec ROLL PNT 67.828173353973 Pointing Roll RA TARG 197.872917 Observer’s specified target RA DEC TARG -1.336 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-11-02T13:19:13 Date and time of file creation DATE-OBS 2001-01-07T08:19:38 Observation start date DATE-END 2001-01-07T11:52:19 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-01236 Detector GRATING NONE Grating OBJECT A1689 Source name TITLE DETERMINATION OF H0 AND Q0, 2000 PART 1

Proposal title

OBSERVER DR. LEON VANSPEYBROECK Principal investigator OBS ID 1663 Observation id SEQ NUM 800131 Sequence number RA NOM 197.89539921738 Nominal RA DEC NOM -1.2863567204577 Nominal Dec ROLL NOM 67.828173353973 Nominal Roll

Summary Page Created:Thu November 2, 2006 08:20 EST page: 3 of 3

Chandra X-ray Center Seq Num: 800131

Instrument: ACIS Obs ID: 1663 Source: A1689 PI: DR. LEON VANSPEYBROECK Title: DETERMINATION OF H0 AND Q0, 2000 PART 1

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 197.825915 -1.241575 231.583328 17.169033 13.488432 197.986721 -1.219873 79.180000 11.297507 7.008626 197.907085 -1.330443 58.000000 8.990870 6.450988 197.832891 -1.363295 30.159090 7.154203 4.215576 197.873622 -1.267459 29.714285 7.275915 4.083924 197.707694 -1.038921 59.950165 14.861987 4.033792 197.898172 -1.156660 32.750000 8.210176 3.988952 197.668637 -1.147971 54.375000 13.713117 3.965182 197.836586 -1.382748 21.000000 6.025764 3.485035 197.898415 -1.156962 26.636364 7.798250 3.415685