Summary Page Created:Thu December 21, 2006 20:56 EST page: 1 of 3

Chandra X-ray Center Seq Num: 800134

Instrument: ACIS Obs ID: 1666 Source: A2218 PI: DR. LEON VANSPEYBROECK Title: DETERMINATION OF H0 AND Q0, 2000 PART 1

acisf01666N002 full img2.fits acisf01666N002 cntr img2.fits

Summary Page Created:Thu December 21, 2006 20:56 EST page: 2 of 3

Chandra X-ray Center Seq Num: 800134

Instrument: ACIS Obs ID: 1666 Source: A2218 PI: DR. LEON VANSPEYBROECK Title: DETERMINATION OF H0 AND Q0, 2000 PART 1

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-12-22T01:00:24 Date and time of file creation DATE-OBS 2001-08-30T06:06:23 Observation start date DATE-END 2001-08-30T20:11:29 Observation end date RA PNT 248.97182975774 Pointing RA DEC PNT 66.251351169924 Pointing Dec ROLL PNT 266.25920727099 Pointing Roll RA TARG 248.97 Observer’s specified target RA DEC TARG 66.214 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.2848053 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-12-22T01:54:35 Date and time of file creation DATE-OBS 2001-08-30T06:06:23 Observation start date DATE-END 2001-08-30T20:11:29 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-01236 Detector GRATING NONE Grating OBJECT A2218 Source name TITLE DETERMINATION OF H0 AND Q0, 2000 PART 1

Proposal title

OBSERVER DR. LEON VANSPEYBROECK Principal investigator OBS ID 1666 Observation id SEQ NUM 800134 Sequence number RA NOM 248.97182975774 Nominal RA DEC NOM 66.251351169924 Nominal Dec ROLL NOM 266.25920727099 Nominal Roll

Summary Page Created:Thu December 21, 2006 20:56 EST page: 3 of 3

Chandra X-ray Center Seq Num: 800134

Instrument: ACIS Obs ID: 1666 Source: A2218 PI: DR. LEON VANSPEYBROECK Title: DETERMINATION OF H0 AND Q0, 2000 PART 1

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 249.129019 66.251672 188.193176 15.910500 11.828238 249.156340 66.188135 174.068176 16.131350 10.790677 248.840972 66.355503 118.179314 14.400794 8.206444 249.171609 66.147102 136.833328 17.161840 7.973115 249.058916 66.236243 100.571426 13.186925 7.626602 248.824133 66.226988 78.795456 11.140116 7.073127 249.563982 66.070860 307.727692 43.988949 6.995568 249.197134 66.247344 88.166664 12.852550 6.859858 249.500363 66.071248 201.083328 30.791080 6.530571 248.916491 66.320494 67.857140 10.422869 6.510409