Summary Page Created:Fri December 8, 2006 01:31 EST page: 1 of 3

Chandra X-ray Center Seq Num: 800178

Instrument: ACIS Obs ID: 2427 Source: PKS0745-191 PI: Prof Andrew Fabian Title: REOBSERAVTION OF PKS0745-191

acisf02427N002 full img2.fits acisf02427N002 cntr img2.fits

Summary Page Created:Fri December 8, 2006 01:31 EST page: 2 of 3

Chandra X-ray Center Seq Num: 800178

Instrument: ACIS Obs ID: 2427 Source: PKS0745-191 PI: Prof Andrew Fabian Title: REOBSERAVTION OF PKS0745-191

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-12-08T05:46:41 Date and time of file creation DATE-OBS 2001-06-16T05:32:52 Observation start date DATE-END 2001-06-16T11:07:47 Observation end date RA PNT 116.86151025351 Pointing RA DEC PNT -19.305523620439 Pointing Dec ROLL PNT 217.97832523207 Pointing Roll RA TARG 116.88 Observer’s specified target RA DEC TARG -19.294167 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.2848053 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-12-08T06:29:34 Date and time of file creation DATE-OBS 2001-06-16T05:32:52 Observation start date DATE-END 2001-06-16T11:07:47 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-35678 Detector GRATING NONE Grating OBJECT PKS0745-191 Source name TITLE REOBSERAVTION OF PKS0745- 191 Proposal title

OBSERVER Prof Andrew Fabian Principal investigator OBS ID 2427 Observation id SEQ NUM 800178 Sequence number RA NOM 116.86151025351 Nominal RA DEC NOM -19.305523620439 Nominal Dec ROLL NOM 217.97832523207 Nominal Roll

Summary Page Created:Fri December 8, 2006 01:31 EST page: 3 of 3

Chandra X-ray Center Seq Num: 800178

Instrument: ACIS Obs ID: 2427 Source: PKS0745-191 PI: Prof Andrew Fabian Title: REOBSERAVTION OF PKS0745-191

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 116.859726 -19.375481 114.000000 13.063948 8.726305 116.979753 -19.137104 163.629471 19.994179 8.183855 116.826851 -19.085824 139.367020 17.328459 8.042667 116.646196 -19.540164 296.584717 40.312710 7.357102 116.570397 -19.443875 314.936890 42.962139 7.330568 116.683088 -19.515807 243.602280 37.757267 6.451798 116.988510 -19.146468 125.515175 20.626431 6.085163 116.826755 -19.087541 101.415283 16.828117 6.026538 117.012476 -19.176582 111.500000 19.936163 5.592851 117.062895 -19.238470 106.989288 19.141541 5.589377