Summary Page Created:Fri December 8, 2006 00:44 EST page: 1 of 3

Chandra X-ray Center Seq Num: 800121

Instrument: ACIS Obs ID: 2455 Source: ABELL 2163 PI: Dr. Stephen Murray Title: DEEP X-RAY IMAGE OF ABELL 2163

acisf02455N002 full img2.fits acisf02455N002 cntr img2.fits

Summary Page Created:Fri December 8, 2006 00:44 EST page: 2 of 3

Chandra X-ray Center Seq Num: 800121

Instrument: ACIS Obs ID: 2455 Source: ABELL 2163 PI: Dr. Stephen Murray Title: DEEP X-RAY IMAGE OF ABELL 2163

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-12-08T05:23:40 Date and time of file creation DATE-OBS 2001-06-17T07:58:27 Observation start date DATE-END 2001-06-17T10:50:44 Observation end date RA PNT 243.97485908579 Pointing RA DEC PNT -6.4518503278853 Pointing Dec ROLL PNT 229.10091241723 Pointing Roll RA TARG 243.979167 Observer’s specified target RA DEC TARG -6.449722 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-12-08T05:43:14 Date and time of file creation DATE-OBS 2001-06-17T07:58:27 Observation start date DATE-END 2001-06-17T10:50:44 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-01236 Detector GRATING NONE Grating OBJECT ABELL 2163 Source name TITLE DEEP X-RAY IMAGE OF ABELL 2163

Proposal title

OBSERVER Dr. Stephen Murray Principal investigator OBS ID 2455 Observation id SEQ NUM 800121 Sequence number RA NOM 243.97485908579 Nominal RA DEC NOM -6.4518503278853 Nominal Dec ROLL NOM 229.10091241723 Nominal Roll

Summary Page Created:Fri December 8, 2006 00:44 EST page: 3 of 3

Chandra X-ray Center Seq Num: 800121

Instrument: ACIS Obs ID: 2455 Source: ABELL 2163 PI: Dr. Stephen Murray Title: DEEP X-RAY IMAGE OF ABELL 2163

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 243.927358 -6.323425 118.458336 13.447873 8.808703 244.014066 -6.705224 134.331039 16.541628 8.120787 243.902763 -6.389594 29.000000 6.678985 4.341978 244.106169 -6.492755 25.916666 6.938414 3.735244 244.104231 -6.677375 40.102272 11.852407 3.383471 244.074680 -6.467168 19.079546 5.952471 3.205315 244.016596 -6.706157 53.113636 16.677452 3.184757