Summary Page Created:Fri January 12, 2007 06:51 EST page: 1 of 3

Chandra X-ray Center Seq Num: 200190

Instrument: ACIS Obs ID: 3363 Source: V 410 TAU PI: Dr. Peter Predehl Title: ORIGIN OF THE X-RAY EMISSION OF THE PREMAIN SEQUENCE STAR V 410 TAU

acisf03363N002 full img2.fits acisf03363N002 cntr img2.fits

Summary Page Created:Fri January 12, 2007 06:51 EST page: 2 of 3

Chandra X-ray Center Seq Num: 200190

Instrument: ACIS Obs ID: 3363 Source: V 410 TAU PI: Dr. Peter Predehl Title: ORIGIN OF THE X-RAY EMISSION OF THE PREMAIN SEQUENCE STAR V 410 TAU

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.10 ASCDS version number DATE 2007-01-12T11:34:27 Date and time of file creation DATE-OBS 2001-11-19T23:37:24 Observation start date DATE-END 2001-11-20T03:00:37 Observation end date RA PNT 64.57067701133 Pointing RA DEC PNT 28.509790877403 Pointing Dec ROLL PNT 134.54951874025 Pointing Roll RA TARG 64.629583 Observer’s specified target RA DEC TARG 28.454444 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.10 ASCDS version number DATE 2007-01-12T11:49:53 Date and time of file creation DATE-OBS 2001-11-19T23:37:24 Observation start date DATE-END 2001-11-20T03:00:37 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-235678 Detector GRATING NONE Grating OBJECT V 410 TAU Source name TITLE ORIGIN OF THE X-RAY EMIS- SION OF THE PREMAIN SE- QUENCE STAR V 410 TAU OBSERVER Dr. Peter Predehl Principal investigator OBS ID 3363 Observation id SEQ NUM 200190 Sequence number RA NOM 64.57067701133 Nominal RA DEC NOM 28.509790877403 Nominal Dec ROLL NOM 134.54951874025 Nominal Roll

Summary Page Created:Fri January 12, 2007 06:51 EST page: 3 of 3

Chandra X-ray Center Seq Num: 200190

Instrument: ACIS Obs ID: 3363 Source: V 410 TAU PI: Dr. Peter Predehl Title: ORIGIN OF THE X-RAY EMISSION OF THE PREMAIN SEQUENCE STAR V 410 TAU

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 64.629673 28.454476 3631.285645 65.689949 55.279167 64.670629 28.323466 4624.091309 92.083611 50.216225 64.671374 28.322021 2704.504883 88.647690 30.508465 64.775509 28.416466 1448.076782 74.423561 19.457235 64.706183 28.297311 1086.458374 68.014488 15.973925 64.807419 28.386656 960.583313 62.163345 15.452568 64.710945 28.362020 1078.541626 75.894302 14.211102 64.654297 28.345151 1033.465942 73.008011 14.155514 64.695197 28.348206 1040.208374 74.013405 14.054324 64.723281 28.372685 1056.375000 75.802803 13.935830