Summary Page Created:Wed September 6, 2006 08:23 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 200191

Instrument: ACIS Obs ID: 3364 Source: V 410 TAU PI: Dr. Peter Predehl Title: ORIGIN OF THE X-RAY EMISSION OF THE PREMAIN SEQUENCE STAR V 410 TAU

acisf03364N003 full img2.fits acisf03364N003 cntr img2.fits

Summary Page Created:Wed September 6, 2006 08:23 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 200191

Instrument: ACIS Obs ID: 3364 Source: V 410 TAU PI: Dr. Peter Predehl Title: ORIGIN OF THE X-RAY EMISSION OF THE PREMAIN SEQUENCE STAR V 410 TAU

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.8.1 ASCDS version number DATE 2006-09-06T11:59:52 Date and time of file creation DATE-OBS 2002-03-07T06:16:32 Observation start date DATE-END 2002-03-07T11:45:24 Observation end date RA PNT 64.644078714545 Pointing RA DEC PNT 28.379790990339 Pointing Dec ROLL PNT 281.11661882484 Pointing Roll RA TARG 64.629583 Observer’s specified target RA DEC TARG 28.454444 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.8.1 ASCDS version number DATE 2006-09-06T12:22:18 Date and time of file creation DATE-OBS 2002-03-07T06:16:32 Observation start date DATE-END 2002-03-07T11:45:24 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-235678 Detector GRATING NONE Grating OBJECT V 410 TAU Source name TITLE ORIGIN OF THE X-RAY EMIS- SION OF THE PREMAIN SE- QUENCE STAR V 410 TAU OBSERVER Dr. Peter Predehl Principal investigator OBS ID 3364 Observation id SEQ NUM 200191 Sequence number RA NOM 64.644078714545 Nominal RA DEC NOM 28.379790990339 Nominal Dec ROLL NOM 281.11661882484 Nominal Roll

Summary Page Created:Wed September 6, 2006 08:23 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 200191

Instrument: ACIS Obs ID: 3364 Source: V 410 TAU PI: Dr. Peter Predehl Title: ORIGIN OF THE X-RAY EMISSION OF THE PREMAIN SEQUENCE STAR V 410 TAU

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 64.629674 28.454468 4995.143066 78.903038 63.307362 64.695989 28.335286 2687.511475 60.415188 44.484035 64.667620 28.406778 1093.000000 38.003532 28.760483 64.669207 28.320911 1115.784058 39.863083 27.990410 64.643607 28.508537 269.613647 20.599670 13.088250 64.673869 28.583440 217.965179 20.185915 10.797885 64.777455 28.091544 472.076416 44.078392 10.709929 64.643500 28.508699 198.208328 21.223934 9.338906 64.644235 28.071935 447.883728 49.372200 9.071577 64.621243 28.438568 117.954544 13.085547 9.014109