Summary Page Created:Sat September 16, 2006 16:06 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 500297

Instrument: ACIS Obs ID: 3495 Source: SN2001IG PI: Dr. Eric Schlegel Title: SN2001IG: DETECTING A MASS LOSS PHASE?

acisf03495N002 full img2.fits acisf03495N002 cntr img2.fits

Summary Page Created:Sat September 16, 2006 16:06 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 500297

Instrument: ACIS Obs ID: 3495 Source: SN2001IG PI: Dr. Eric Schlegel Title: SN2001IG: DETECTING A MASS LOSS PHASE?

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-09-16T19:47:01 Date and time of file creation DATE-OBS 2002-05-21T23:35:42 Observation start date DATE-END 2002-05-22T06:35:36 Observation end date RA PNT 344.37450559384 Pointing RA DEC PNT -41.030907423434 Pointing Dec ROLL PNT 115.57928431153 Pointing Roll RA TARG 344.377917 Observer’s specified target RA DEC TARG -41.040278 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-09-16T20:04:47 Date and time of file creation DATE-OBS 2002-05-21T23:35:42 Observation start date DATE-END 2002-05-22T06:35:36 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-235678 Detector GRATING NONE Grating OBJECT SN2001IG Source name TITLE SN2001IG: DETECTING A MASS LOSS PHASE?

Proposal title

OBSERVER Dr. Eric Schlegel Principal investigator OBS ID 3495 Observation id SEQ NUM 500297 Sequence number RA NOM 344.37450559384 Nominal RA DEC NOM -41.030907423434 Nominal Dec ROLL NOM 115.57928431153 Nominal Roll

Summary Page Created:Sat September 16, 2006 16:06 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 500297

Instrument: ACIS Obs ID: 3495 Source: SN2001IG PI: Dr. Eric Schlegel Title: SN2001IG: DETECTING A MASS LOSS PHASE?

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 344.370572 -41.036632 921.000000 32.261337 28.548105 344.415755 -41.174674 421.090912 24.391449 17.263874 344.270875 -40.730513 639.897034 51.909203 12.327236 344.346930 -41.020934 168.857147 14.795243 11.412934 344.552234 -41.217465 236.843140 24.135586 9.813026 344.126302 -40.781750 427.415283 45.144428 9.467731 344.349407 -41.048649 113.285713 12.892590 8.786886 344.137163 -40.801384 412.709808 48.979755 8.426130 344.352949 -41.062129 91.142860 11.426929 7.976146 344.277641 -40.736696 380.232147 49.741661 7.644138