Summary Page Created:Tue September 26, 2006 07:25 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 500204

Instrument: ACIS Obs ID: 3720 Source: MSH 11-61A PI: Dr. Peter Predehl Title: AN X-RAY STUDY OF THE CENTER-FILLED SNR MSH11-61A AND ITS NEUTRON STAR

CANDIDATE RX J1102.9-6054

acisf03720N003 full img2.fits acisf03720N003 cntr img2.fits

Summary Page Created:Tue September 26, 2006 07:25 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 500204

Instrument: ACIS Obs ID: 3720 Source: MSH 11-61A PI: Dr. Peter Predehl Title: AN X-RAY STUDY OF THE CENTER-FILLED SNR MSH11-61A AND ITS NEUTRON STAR

CANDIDATE RX J1102.9-6054

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-09-26T10:48:34 Date and time of file creation DATE-OBS 2002-07-21T01:46:41 Observation start date DATE-END 2002-07-21T11:42:24 Observation end date RA PNT 165.68087113673 Pointing RA DEC PNT -60.909636548032 Pointing Dec ROLL PNT 222.00190119284 Pointing Roll RA TARG 165.738333 Observer’s specified target RA DEC TARG -60.909444 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-09-26T11:23:02 Date and time of file creation DATE-OBS 2002-07-21T01:46:41 Observation start date DATE-END 2002-07-21T11:42:24 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-01236 Detector GRATING NONE Grating OBJECT MSH 11-61A Source name TITLE AN X-RAY STUDY OF THE CENTER-FILLED SNR MSH11- 61A AND ITS NEUTRON STAR CANDIDATE RX J1102.9-6054

Proposal title

OBSERVER Dr. Peter Predehl Principal investigator OBS ID 3720 Observation id SEQ NUM 500204 Sequence number RA NOM 165.68087113673 Nominal RA DEC NOM -60.909636548032 Nominal Dec ROLL NOM 222.00190119284 Nominal Roll

Summary Page Created:Tue September 26, 2006 07:25 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 500204

Instrument: ACIS Obs ID: 3720 Source: MSH 11-61A PI: Dr. Peter Predehl Title: AN X-RAY STUDY OF THE CENTER-FILLED SNR MSH11-61A AND ITS NEUTRON STAR

CANDIDATE RX J1102.9-6054

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 165.828076 -60.920689 625.714294 27.603542 22.667898 165.493734 -60.947289 256.272736 18.102295 14.156919 165.860680 -60.909642 78.500000 11.600685 6.766842 165.770505 -60.893115 64.571426 10.429624 6.191156 165.534747 -60.808969 79.261360 13.697467 5.786571 165.679307 -60.827703 54.625000 10.014201 5.454753 165.731777 -61.037712 50.750000 9.380627 5.410086 165.688254 -61.022401 54.077499 10.124278 5.341369 165.363420 -60.876388 62.642502 12.268762 5.105854 165.709240 -60.784294 49.954544 9.806437 5.094057