Summary Page Created:Sat September 16, 2006 15:43 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 600281

Instrument: ACIS Obs ID: 2944 Source: SMC FIELD 7 PI: Dr. Andreas Zezas Title: A CHANDRA SURVEY OF THE SMC

acisf02944N002 full img2.fits acisf02944N002 cntr img2.fits

Summary Page Created:Sat September 16, 2006 15:43 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 600281

Instrument: ACIS Obs ID: 2944 Source: SMC FIELD 7 PI: Dr. Andreas Zezas Title: A CHANDRA SURVEY OF THE SMC

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-09-16T19:29:56 Date and time of file creation DATE-OBS 2002-05-21T20:36:26 Observation start date DATE-END 2002-05-21T23:35:42 Observation end date RA PNT 12.354547419025 Pointing RA DEC PNT -72.739665642266 Pointing Dec ROLL PNT 137.16527827759 Pointing Roll RA TARG 12.360833 Observer’s specified target RA DEC TARG -72.743889 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-09-16T19:42:23 Date and time of file creation DATE-OBS 2002-05-21T20:36:26 Observation start date DATE-END 2002-05-21T23:35:42 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-012367 Detector GRATING NONE Grating OBJECT SMC FIELD 7 Source name TITLE A CHANDRA SURVEY OF THE SMC Proposal title

OBSERVER Dr. Andreas Zezas Principal investigator OBS ID 2944 Observation id SEQ NUM 600281 Sequence number RA NOM 12.354547419025 Nominal RA DEC NOM -72.739665642266 Nominal Dec ROLL NOM 137.16527827759 Nominal Roll

Summary Page Created:Sat September 16, 2006 15:43 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 600281

Instrument: ACIS Obs ID: 2944 Source: SMC FIELD 7 PI: Dr. Andreas Zezas Title: A CHANDRA SURVEY OF THE SMC

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 12.263757 -72.847897 145.770004 14.540361 10.025198 11.596183 -72.954320 169.235886 30.886417 5.479298 12.383790 -72.657072 43.916668 8.312194 5.283402 11.795934 -73.007589 173.122925 33.844585 5.115233 11.890102 -73.029214 168.399597 33.004452 5.102330 12.501079 -72.824684 36.000000 7.268045 4.953189 12.435819 -72.869792 34.875000 7.845791 4.445058 11.788933 -72.718490 33.055172 8.433480 3.919517 11.901183 -72.760755 29.791666 7.825362 3.807066 11.845091 -73.021490 133.382309 35.269554 3.781797