Summary Page Created:Sat October 7, 2006 12:57 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 600282

Instrument: ACIS Obs ID: 2945 Source: SMC FIELD 4 PI: Dr. Andreas Zezas Title: A CHANDRA SURVEY OF THE SMC

acisf02945N003 full img2.fits acisf02945N003 cntr img2.fits

Summary Page Created:Sat October 7, 2006 12:57 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 600282

Instrument: ACIS Obs ID: 2945 Source: SMC FIELD 4 PI: Dr. Andreas Zezas Title: A CHANDRA SURVEY OF THE SMC

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-10-07T16:44:21 Date and time of file creation DATE-OBS 2002-10-02T15:13:34 Observation start date DATE-END 2002-10-02T18:51:10 Observation end date RA PNT 12.37809409972 Pointing RA DEC PNT -73.281205275517 Pointing Dec ROLL PNT 4.1234895917658 Pointing Roll RA TARG 12.362917 Observer’s specified target RA DEC TARG -73.279722 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-10-07T16:56:16 Date and time of file creation DATE-OBS 2002-10-02T15:13:34 Observation start date DATE-END 2002-10-02T18:51:10 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-012367 Detector GRATING NONE Grating OBJECT SMC FIELD 4 Source name TITLE A CHANDRA SURVEY OF THE SMC Proposal title

OBSERVER Dr. Andreas Zezas Principal investigator OBS ID 2945 Observation id SEQ NUM 600282 Sequence number RA NOM 12.37809409972 Nominal RA DEC NOM -73.281205275517 Nominal Dec ROLL NOM 4.1234895917658 Nominal Roll

Summary Page Created:Sat October 7, 2006 12:57 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 600282

Instrument: ACIS Obs ID: 2945 Source: SMC FIELD 4 PI: Dr. Andreas Zezas Title: A CHANDRA SURVEY OF THE SMC

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 12.686127 -73.268210 344.916656 21.300192 16.193125 12.306686 -73.193827 203.541672 16.352381 12.447219 12.738926 -73.169022 215.335007 17.981730 11.975211 11.965682 -72.982419 400.365692 36.557339 10.951719 12.078438 -73.349897 117.180000 13.011874 9.005620 12.373653 -73.182950 93.715912 11.765285 7.965460 12.222125 -73.415982 91.511360 12.522495 7.307758 12.059476 -73.167825 80.113640 11.574396 6.921626 12.375356 -72.973138 206.159470 31.541334 6.536169 12.064779 -72.979441 237.946838 38.238888 6.222641