Summary Page Created:Thu October 12, 2006 10:45 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 700412

Instrument: ACIS Obs ID: 2973 Source: LBQS 1240+1607 PI: Professor Gordon Garmire Title: A COMPLETE X-RAY SAMPLE OF BROAD ABSORPTION LINE QSOS

acisf02973N003 full img2.fits acisf02973N003 cntr img2.fits

Summary Page Created:Thu October 12, 2006 10:45 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 700412

Instrument: ACIS Obs ID: 2973 Source: LBQS 1240+1607 PI: Professor Gordon Garmire Title: A COMPLETE X-RAY SAMPLE OF BROAD ABSORPTION LINE QSOS

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-10-12T14:32:06 Date and time of file creation DATE-OBS 2002-11-16T22:05:31 Observation start date DATE-END 2002-11-17T00:18:22 Observation end date RA PNT 190.77228079352 Pointing RA DEC PNT 15.852347731703 Pointing Dec ROLL PNT 51.086627175338 Pointing Roll RA TARG 190.765 Observer’s specified target RA DEC TARG 15.846389 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-10-12T14:44:46 Date and time of file creation DATE-OBS 2002-11-16T22:05:31 Observation start date DATE-END 2002-11-17T00:18:22 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-235678 Detector GRATING NONE Grating OBJECT LBQS 1240+1607 Source name TITLE A COMPLETE X-RAY SAMPLE OF BROAD ABSORPTION LINE QSOS

Proposal tit

OBSERVER Professor Gordon Garmire Principal investigator OBS ID 2973 Observation id SEQ NUM 700412 Sequence number RA NOM 190.77228079352 Nominal RA DEC NOM 15.852347731703 Nominal Dec ROLL NOM 51.086627175338 Nominal Roll

Summary Page Created:Thu October 12, 2006 10:45 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 700412

Instrument: ACIS Obs ID: 2973 Source: LBQS 1240+1607 PI: Professor Gordon Garmire Title: A COMPLETE X-RAY SAMPLE OF BROAD ABSORPTION LINE QSOS

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 190.799819 15.841924 123.428574 12.725888 9.699015 191.016666 16.054858 192.681061 30.054026 6.411157 190.921831 16.130706 106.232559 22.717157 4.676314 190.989021 16.079087 106.966774 26.681782 4.008982 190.898481 16.102869 102.458336 25.748720 3.979162 190.799274 15.778751 27.428572 7.383908 3.714642 190.985983 16.009779 82.241379 22.380308 3.674721 190.959442 16.098775 99.331253 27.430889 3.621146 191.005204 16.032631 96.166664 26.947420 3.568678 190.808662 15.868704 23.714285 6.768929 3.503403