Summary Page Created:Sat September 9, 2006 11:57 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 700503

Instrument: ACIS Obs ID: 3064 Source: HS 0810+5157 PI: Dr Guido Risaliti Title: X-RAY WEAK BROAD-LINE QUASARS: ABSORPTION OR INTRINSIC X RAY WEAKNESS ?

acisf03064N002 full img2.fits acisf03064N002 cntr img2.fits

Summary Page Created:Sat September 9, 2006 11:57 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 700503

Instrument: ACIS Obs ID: 3064 Source: HS 0810+5157 PI: Dr Guido Risaliti Title: X-RAY WEAK BROAD-LINE QUASARS: ABSORPTION OR INTRINSIC X RAY WEAKNESS ?

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.8.1 ASCDS version number DATE 2006-09-09T15:31:45 Date and time of file creation DATE-OBS 2002-04-06T13:34:41 Observation start date DATE-END 2002-04-06T16:19:36 Observation end date RA PNT 123.58449118285 Pointing RA DEC PNT 51.802362839325 Pointing Dec ROLL PNT 251.69413474841 Pointing Roll RA TARG 123.592083 Observer’s specified target RA DEC TARG 51.810972 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.8.1 ASCDS version number DATE 2006-09-09T15:56:21 Date and time of file creation DATE-OBS 2002-04-06T13:34:41 Observation start date DATE-END 2002-04-06T16:19:36 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-235678 Detector GRATING NONE Grating OBJECT HS 0810+5157 Source name TITLE X-RAY WEAK BROAD- LINE QUASARS: ABSORPTION OR INTRINSIC X RAY WEAK- NESS ?

Proposal title

OBSERVER Dr Guido Risaliti Principal investigator OBS ID 3064 Observation id SEQ NUM 700503 Sequence number RA NOM 123.58449118285 Nominal RA DEC NOM 51.802362839325 Nominal Dec ROLL NOM 251.69413474841 Nominal Roll

Summary Page Created:Sat September 9, 2006 11:57 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 700503

Instrument: ACIS Obs ID: 3064 Source: HS 0810+5157 PI: Dr Guido Risaliti Title: X-RAY WEAK BROAD-LINE QUASARS: ABSORPTION OR INTRINSIC X RAY WEAKNESS ?

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 123.592173 51.810910 1055.714233 35.067909 30.104855 123.529404 51.495362 197.328903 26.507549 7.444253 123.533712 51.502722 167.808929 26.703224 6.284220 123.342516 51.528518 172.272430 27.768015 6.203988 123.500227 51.500985 162.318939 31.223726 5.198577 123.448110 51.508432 131.056473 28.219007 4.644262 123.385213 51.521351 134.235886 30.288363 4.431929 123.429236 51.646967 49.102272 12.266964 4.002806 123.591822 51.601257 48.300892 13.205015 3.657769 123.231276 51.933589 40.206898 11.437844 3.515251