Summary Page Created:Fri September 8, 2006 05:08 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 700504

Instrument: ACIS Obs ID: 3065 Source: HS 0830+1833 PI: Dr Guido Risaliti Title: X-RAY WEAK BROAD-LINE QUASARS: ABSORPTION OR INTRINSIC X RAY WEAKNESS ?

acisf03065N002 full img2.fits acisf03065N002 cntr img2.fits

Summary Page Created:Fri September 8, 2006 05:08 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 700504

Instrument: ACIS Obs ID: 3065 Source: HS 0830+1833 PI: Dr Guido Risaliti Title: X-RAY WEAK BROAD-LINE QUASARS: ABSORPTION OR INTRINSIC X RAY WEAKNESS ?

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.8.1 ASCDS version number DATE 2006-09-08T08:47:16 Date and time of file creation DATE-OBS 2002-03-23T06:21:06 Observation start date DATE-END 2002-03-23T08:31:38 Observation end date RA PNT 128.2275475785 Pointing RA DEC PNT 18.374559101135 Pointing Dec ROLL PNT 256.20119288164 Pointing Roll RA TARG 128.231667 Observer’s specified target RA DEC TARG 18.383472 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.8.1 ASCDS version number DATE 2006-09-08T09:07:01 Date and time of file creation DATE-OBS 2002-03-23T06:21:06 Observation start date DATE-END 2002-03-23T08:31:38 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-235678 Detector GRATING NONE Grating OBJECT HS 0830+1833 Source name TITLE X-RAY WEAK BROAD- LINE QUASARS: ABSORPTION OR INTRINSIC X RAY WEAK- NESS ?

Proposal title

OBSERVER Dr Guido Risaliti Principal investigator OBS ID 3065 Observation id SEQ NUM 700504 Sequence number RA NOM 128.2275475785 Nominal RA DEC NOM 18.374559101135 Nominal Dec ROLL NOM 256.20119288164 Nominal Roll

Summary Page Created:Fri September 8, 2006 05:08 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 700504

Instrument: ACIS Obs ID: 3065 Source: HS 0830+1833 PI: Dr Guido Risaliti Title: X-RAY WEAK BROAD-LINE QUASARS: ABSORPTION OR INTRINSIC X RAY WEAKNESS ?

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 128.298843 18.555031 171.416672 21.580360 7.943179 128.234666 18.545146 148.793106 20.823008 7.145611 128.231837 18.383511 67.000000 9.537721 7.024739 128.322380 18.550185 133.250000 19.472063 6.843137 128.230757 18.571320 139.625000 20.506212 6.808913 128.253654 18.565822 133.000000 19.817648 6.711190 128.288199 18.557124 134.625000 20.376131 6.606995 128.090674 18.092310 173.342194 27.185934 6.376172 128.204814 18.553813 124.704544 19.829456 6.288854 128.103826 18.087441 173.431900 28.253517 6.138418