Summary Page Created:Tue September 26, 2006 05:38 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 700509

Instrument: ACIS Obs ID: 3070 Source: HS 1202+3538 PI: Dr Guido Risaliti Title: X-RAY WEAK BROAD-LINE QUASARS: ABSORPTION OR INTRINSIC X RAY WEAKNESS ?

acisf03070N002 full img2.fits acisf03070N002 cntr img2.fits

Summary Page Created:Tue September 26, 2006 05:38 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 700509

Instrument: ACIS Obs ID: 3070 Source: HS 1202+3538 PI: Dr Guido Risaliti Title: X-RAY WEAK BROAD-LINE QUASARS: ABSORPTION OR INTRINSIC X RAY WEAKNESS ?

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-09-26T09:15:25 Date and time of file creation DATE-OBS 2002-07-21T22:02:57 Observation start date DATE-END 2002-07-22T00:22:42 Observation end date RA PNT 181.2660788846 Pointing RA DEC PNT 35.359474310908 Pointing Dec ROLL PNT 269.26601837135 Pointing Roll RA TARG 181.268333 Observer’s specified target RA DEC TARG 35.368917 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-09-26T09:37:08 Date and time of file creation DATE-OBS 2002-07-21T22:02:57 Observation start date DATE-END 2002-07-22T00:22:42 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-235678 Detector GRATING NONE Grating OBJECT HS 1202+3538 Source name TITLE X-RAY WEAK BROAD- LINE QUASARS: ABSORPTION OR INTRINSIC X RAY WEAK- NESS ?

Proposal title

OBSERVER Dr Guido Risaliti Principal investigator OBS ID 3070 Observation id SEQ NUM 700509 Sequence number RA NOM 181.2660788846 Nominal RA DEC NOM 35.359474310908 Nominal Dec ROLL NOM 269.26601837135 Nominal Roll

Summary Page Created:Tue September 26, 2006 05:38 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 700509

Instrument: ACIS Obs ID: 3070 Source: HS 1202+3538 PI: Dr Guido Risaliti Title: X-RAY WEAK BROAD-LINE QUASARS: ABSORPTION OR INTRINSIC X RAY WEAKNESS ?

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 181.222255 35.584780 151.355713 17.757965 8.523258 181.222976 35.586539 139.705887 17.811129 7.843741 181.186665 35.053206 192.016617 25.994413 7.386842 181.337392 35.052760 189.787369 26.086231 7.275385 181.298639 35.359236 67.428574 10.012700 6.734304 181.247321 35.351977 61.714287 9.467747 6.518371 181.338934 35.086386 165.958328 26.509773 6.260270 181.268312 35.368922 48.428570 8.878010 5.454891 181.261342 35.467586 50.974998 10.091867 5.051097 181.266094 35.509586 45.795456 9.337769 4.904325