Summary Page Created:Thu September 14, 2006 16:49 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 700512

Instrument: ACIS Obs ID: 3073 Source: HS 1237+4756 PI: Dr Guido Risaliti Title: X-RAY WEAK BROAD-LINE QUASARS: ABSORPTION OR INTRINSIC X RAY WEAKNESS ?

acisf03073N002 full img2.fits acisf03073N002 cntr img2.fits

Summary Page Created:Thu September 14, 2006 16:49 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 700512

Instrument: ACIS Obs ID: 3073 Source: HS 1237+4756 PI: Dr Guido Risaliti Title: X-RAY WEAK BROAD-LINE QUASARS: ABSORPTION OR INTRINSIC X RAY WEAKNESS ?

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-09-14T20:25:08 Date and time of file creation DATE-OBS 2002-05-02T12:35:03 Observation start date DATE-END 2002-05-02T14:16:27 Observation end date RA PNT 190.01493577596 Pointing RA DEC PNT 47.663511932536 Pointing Dec ROLL PNT 214.7273312866 Pointing Roll RA TARG 190.027917 Observer’s specified target RA DEC TARG 47.667583 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-09-14T20:48:08 Date and time of file creation DATE-OBS 2002-05-02T12:35:03 Observation start date DATE-END 2002-05-02T14:16:27 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-235678 Detector GRATING NONE Grating OBJECT HS 1237+4756 Source name TITLE X-RAY WEAK BROAD- LINE QUASARS: ABSORPTION OR INTRINSIC X RAY WEAK- NESS ?

Proposal title

OBSERVER Dr Guido Risaliti Principal investigator OBS ID 3073 Observation id SEQ NUM 700512 Sequence number RA NOM 190.01493577596 Nominal RA DEC NOM 47.663511932536 Nominal Dec ROLL NOM 214.7273312866 Nominal Roll

Summary Page Created:Thu September 14, 2006 16:49 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 700512

Instrument: ACIS Obs ID: 3073 Source: HS 1237+4756 PI: Dr Guido Risaliti Title: X-RAY WEAK BROAD-LINE QUASARS: ABSORPTION OR INTRINSIC X RAY WEAKNESS ?

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 190.028006 47.667570 211.142853 16.136332 13.084936 189.893120 47.537426 71.954544 10.988767 6.548009 189.598417 47.538156 144.966782 27.420166 5.286867 190.186971 47.665879 48.041378 9.127807 5.263190 189.694954 47.441355 119.787376 24.632816 4.862918 189.607091 47.525436 111.827240 27.985842 3.995851 189.638461 47.493593 85.495018 25.335205 3.374554 189.730835 47.450984 67.833336 21.037025 3.224473 189.979995 47.876861 23.617941 7.418654 3.183588 189.803775 47.486132 47.253990 14.939081 3.163112