Summary Page Created:Mon October 9, 2006 11:46 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 700514

Instrument: ACIS Obs ID: 3075 Source: HS 1415+2701 PI: Dr Guido Risaliti Title: X-RAY WEAK BROAD-LINE QUASARS: ABSORPTION OR INTRINSIC X RAY WEAKNESS ?

acisf03075N002 full img2.fits acisf03075N002 cntr img2.fits

Summary Page Created:Mon October 9, 2006 11:46 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 700514

Instrument: ACIS Obs ID: 3075 Source: HS 1415+2701 PI: Dr Guido Risaliti Title: X-RAY WEAK BROAD-LINE QUASARS: ABSORPTION OR INTRINSIC X RAY WEAKNESS ?

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-10-09T15:22:20 Date and time of file creation DATE-OBS 2002-11-16T19:08:55 Observation start date DATE-END 2002-11-16T22:05:31 Observation end date RA PNT 214.40348337049 Pointing RA DEC PNT 26.799810877961 Pointing Dec ROLL PNT 22.340596549874 Pointing Roll RA TARG 214.392917 Observer’s specified target RA DEC TARG 26.797778 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.60722351 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-10-09T15:44:52 Date and time of file creation DATE-OBS 2002-11-16T19:08:55 Observation start date DATE-END 2002-11-16T22:05:31 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-235678 Detector GRATING NONE Grating OBJECT HS 1415+2701 Source name TITLE X-RAY WEAK BROAD- LINE QUASARS: ABSORPTION OR INTRINSIC X RAY WEAK- NESS ?

Proposal title

OBSERVER Dr Guido Risaliti Principal investigator OBS ID 3075 Observation id SEQ NUM 700514 Sequence number RA NOM 214.40348337049 Nominal RA DEC NOM 26.799810877961 Nominal Dec ROLL NOM 22.340596549874 Nominal Roll

Summary Page Created:Mon October 9, 2006 11:46 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 700514

Instrument: ACIS Obs ID: 3075 Source: HS 1415+2701 PI: Dr Guido Risaliti Title: X-RAY WEAK BROAD-LINE QUASARS: ABSORPTION OR INTRINSIC X RAY WEAKNESS ?

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 214.376750 26.749146 102.477272 11.898534 8.612597 214.495254 26.631122 126.958336 14.818470 8.567574 214.746113 26.858858 210.578079 28.315094 7.436955 214.673899 26.967371 166.770538 30.461391 5.474817 214.580486 26.594929 67.261360 13.209278 5.091979 214.690167 26.969928 163.810638 33.387310 4.906374 214.700552 26.840081 117.011360 24.611280 4.754379 214.732703 26.890427 156.421921 32.989323 4.741592 214.740612 26.870912 146.817276 33.576977 4.372558 214.719197 26.917223 137.976746 33.821888 4.079510