Summary Page Created:Sun September 17, 2006 23:48 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 700515

Instrument: ACIS Obs ID: 3076 Source: HS 1417+4722 PI: Dr Guido Risaliti Title: X-RAY WEAK BROAD-LINE QUASARS: ABSORPTION OR INTRINSIC X RAY WEAKNESS ?

acisf03076N002 full img2.fits acisf03076N002 cntr img2.fits

Summary Page Created:Sun September 17, 2006 23:48 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 700515

Instrument: ACIS Obs ID: 3076 Source: HS 1417+4722 PI: Dr Guido Risaliti Title: X-RAY WEAK BROAD-LINE QUASARS: ABSORPTION OR INTRINSIC X RAY WEAKNESS ?

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-09-18T03:31:22 Date and time of file creation DATE-OBS 2002-06-02T16:53:52 Observation start date DATE-END 2002-06-02T19:29:36 Observation end date RA PNT 214.95214030918 Pointing RA DEC PNT 47.147562823389 Pointing Dec ROLL PNT 206.07702005066 Pointing Roll RA TARG 214.965833 Observer’s specified target RA DEC TARG 47.15025 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-09-18T03:47:43 Date and time of file creation DATE-OBS 2002-06-02T16:53:52 Observation start date DATE-END 2002-06-02T19:29:36 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-235678 Detector GRATING NONE Grating OBJECT HS 1417+4722 Source name TITLE X-RAY WEAK BROAD- LINE QUASARS: ABSORPTION OR INTRINSIC X RAY WEAK- NESS ?

Proposal title

OBSERVER Dr Guido Risaliti Principal investigator OBS ID 3076 Observation id SEQ NUM 700515 Sequence number RA NOM 214.95214030918 Nominal RA DEC NOM 47.147562823389 Nominal Dec ROLL NOM 206.07702005066 Nominal Roll

Summary Page Created:Sun September 17, 2006 23:48 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 700515

Instrument: ACIS Obs ID: 3076 Source: HS 1417+4722 PI: Dr Guido Risaliti Title: X-RAY WEAK BROAD-LINE QUASARS: ABSORPTION OR INTRINSIC X RAY WEAKNESS ?

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 215.017874 47.121325 347.477264 20.083200 17.301888 214.965987 47.150371 168.142853 14.638688 11.486197 214.826443 47.127092 145.458328 14.494147 10.035660 215.150141 47.241442 53.384998 9.647517 5.533548 215.035650 47.124907 38.079544 7.611241 5.003066 214.537399 47.075005 151.019638 30.488420 4.953344 214.588316 46.958069 139.438538 28.165701 4.950650 214.510810 47.067528 137.521591 28.628735 4.803621 214.607140 46.962101 123.829468 28.539482 4.338883 214.551268 47.080971 118.833336 29.589209 4.016104