Summary Page Created:Wed October 4, 2006 14:26 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 700516

Instrument: ACIS Obs ID: 3077 Source: HS 1422+4224 PI: Dr Guido Risaliti Title: X-RAY WEAK BROAD-LINE QUASARS: ABSORPTION OR INTRINSIC X RAY WEAKNESS ?

acisf03077N002 full img2.fits acisf03077N002 cntr img2.fits

Summary Page Created:Wed October 4, 2006 14:26 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 700516

Instrument: ACIS Obs ID: 3077 Source: HS 1422+4224 PI: Dr Guido Risaliti Title: X-RAY WEAK BROAD-LINE QUASARS: ABSORPTION OR INTRINSIC X RAY WEAKNESS ?

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-10-04T18:08:35 Date and time of file creation DATE-OBS 2002-09-25T05:22:08 Observation start date DATE-END 2002-09-25T07:31:33 Observation end date RA PNT 216.15749483675 Pointing RA DEC PNT 42.167342369107 Pointing Dec ROLL PNT 315.15622854463 Pointing Roll RA TARG 216.15 Observer’s specified target RA DEC TARG 42.175167 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-10-04T18:25:11 Date and time of file creation DATE-OBS 2002-09-25T05:22:08 Observation start date DATE-END 2002-09-25T07:31:33 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-235678 Detector GRATING NONE Grating OBJECT HS 1422+4224 Source name TITLE X-RAY WEAK BROAD- LINE QUASARS: ABSORPTION OR INTRINSIC X RAY WEAK- NESS ?

Proposal title

OBSERVER Dr Guido Risaliti Principal investigator OBS ID 3077 Observation id SEQ NUM 700516 Sequence number RA NOM 216.15749483675 Nominal RA DEC NOM 42.167342369107 Nominal Dec ROLL NOM 315.15622854463 Nominal Roll

Summary Page Created:Wed October 4, 2006 14:26 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 700516

Instrument: ACIS Obs ID: 3077 Source: HS 1422+4224 PI: Dr Guido Risaliti Title: X-RAY WEAK BROAD-LINE QUASARS: ABSORPTION OR INTRINSIC X RAY WEAKNESS ?

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 216.149925 42.175107 125.142860 12.953219 9.661139 216.058842 42.233426 108.511360 13.243007 8.193862 215.966168 42.226251 92.282501 11.799500 7.820882 216.387170 41.912057 159.202652 28.114565 5.662640 216.110952 42.235399 44.142857 8.829981 4.999202 216.501125 41.996337 123.591362 27.784023 4.448289 216.464647 41.964713 122.215950 28.512888 4.286341 216.179523 42.206573 26.714285 7.028038 3.801102 216.474094 42.019535 91.875000 25.085218 3.662516 216.438318 41.944967 97.362129 27.413038 3.551672